From b8c1ca11b76f3d32e9680dfd1cbb611f000f7382 Mon Sep 17 00:00:00 2001
From: Bob Igo <bob@stormlogic.com>
Date: Wed, 8 Jul 2009 15:21:16 -0400
Subject: In R6, twk_graphics.pl can catch the wrong output from glxgears.

---
 abs/core-testing/tweaker/PKGBUILD            | 2 +-
 abs/core-testing/tweaker/bin/twk_graphics.pl | 2 +-
 2 files changed, 2 insertions(+), 2 deletions(-)

diff --git a/abs/core-testing/tweaker/PKGBUILD b/abs/core-testing/tweaker/PKGBUILD
index 9c9b54a..5f92817 100644
--- a/abs/core-testing/tweaker/PKGBUILD
+++ b/abs/core-testing/tweaker/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=tweaker
 pkgver=1
-pkgrel=33
+pkgrel=34
 pkgdesc=""
 arch=('i686' 'x86_64')
 
diff --git a/abs/core-testing/tweaker/bin/twk_graphics.pl b/abs/core-testing/tweaker/bin/twk_graphics.pl
index 4fb6d77..22b6688 100755
--- a/abs/core-testing/tweaker/bin/twk_graphics.pl
+++ b/abs/core-testing/tweaker/bin/twk_graphics.pl
@@ -43,7 +43,7 @@ sub check_for_GL() {
 	    # Now poll the strength, returning the FPS from glxgears, run at the default resolution.
 	    # I would love to be able to poll this in a way that 1) doesn't pop up a GUI window and
 	    # 2) doesn't rely on manually making a database that maps video cards to performance levels.
-	    $result = execute_shell_command("script -q -c \"glxgears -fullscreen &  sleep 11 ;  pkill -15 glxgears\" | tail -1");
+	    $result = execute_shell_command("script -q -c \"glxgears -fullscreen &  sleep 11 ;  pkill -15 glxgears\" | grep FPS | tail -1");
 	    if ($result =~ m/ (\d+)\.\d+ FPS/) {
 		$fps = $1;
 		execute_shell_command("echo $fps > /tmp/fps");
-- 
cgit v0.12

