From 06b2ba5bf8e5869f447daf378786d850f3a957e4 Mon Sep 17 00:00:00 2001
From: Britney Fransen <brfransen@gmail.com>
Date: Thu, 7 Apr 2016 12:41:02 +0000
Subject: LinHES-system: in system.install kill msg_daemd to ensure there are
 no messages that hang on screen

---
 abs/core/LinHES-system/PKGBUILD       | 2 +-
 abs/core/LinHES-system/system.install | 1 +
 2 files changed, 2 insertions(+), 1 deletion(-)

diff --git a/abs/core/LinHES-system/PKGBUILD b/abs/core/LinHES-system/PKGBUILD
index 5ce693a..a7104ea 100755
--- a/abs/core/LinHES-system/PKGBUILD
+++ b/abs/core/LinHES-system/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=LinHES-system
 pkgver=8.4
-pkgrel=5
+pkgrel=6
 arch=('i686' 'x86_64')
 install=system.install
 pkgdesc="Everything that makes LinHES an automated system"
diff --git a/abs/core/LinHES-system/system.install b/abs/core/LinHES-system/system.install
index ae787f2..558a52a 100644
--- a/abs/core/LinHES-system/system.install
+++ b/abs/core/LinHES-system/system.install
@@ -25,6 +25,7 @@ pre_upgrade() {
     msg_client.py --clear
     msg_client.py --kill
     sv stop msg_daemon
+    killall -9 msg_daemon.py
 }
 
 # arg 1:  the new package version
-- 
cgit v0.12

