From 2f50bd91b94e16dfb8eee9d399d41e3d0b5c61a9 Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Sun, 13 May 2012 21:52:26 -0500
Subject: mythinstall: set ncid client to false by default.

---
 abs/core/mythinstall/PKGBUILD | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

diff --git a/abs/core/mythinstall/PKGBUILD b/abs/core/mythinstall/PKGBUILD
index 6d6e615..62e2e0c 100644
--- a/abs/core/mythinstall/PKGBUILD
+++ b/abs/core/mythinstall/PKGBUILD
@@ -1,7 +1,7 @@
 # Maintainer: Jams
 pkgname=mythinstall
 pkgver=3
-pkgrel=24
+pkgrel=25
 pkgdesc="LinHES installer/systemconfig GUI."
 arch=i686
 depends=('mythtv>=0.25')
-- 
cgit v0.12

