From fbd1e801fd79ac1ef17a639d2b25f5ccfe2ed21c Mon Sep 17 00:00:00 2001
From: Britney Fransen <brfransen@gmail.com>
Date: Sat, 4 Feb 2023 22:53:29 -0500
Subject: mythtv: rebuild with flags removed

---
 linhes/mythtv/PKGBUILD    | 6 +++---
 linhes/mythtv/__changelog | 1 -
 2 files changed, 3 insertions(+), 4 deletions(-)

diff --git a/linhes/mythtv/PKGBUILD b/linhes/mythtv/PKGBUILD
index 871a51d..e82becb 100644
--- a/linhes/mythtv/PKGBUILD
+++ b/linhes/mythtv/PKGBUILD
@@ -103,9 +103,9 @@ pkgver() {
 build() {
   cd "${srcdir}/mythtv/mythtv"
 
-  CFLAGS="${CFLAGS/flto=auto/fPIC}"
-  CXXFLAGS="${CXXFLAGS/flto=auto/fPIC}"
-  LDFLAGS="${LDFLAGS/flto=auto/fPIC}"
+#  CFLAGS="${CFLAGS/flto=auto/fPIC}"
+#  CXXFLAGS="${CXXFLAGS/flto=auto/fPIC}"
+#  LDFLAGS="${LDFLAGS/flto=auto/fPIC}"
 
   ARCH="${CARCH/_/-}"
   ./configure --prefix=/usr \
diff --git a/linhes/mythtv/__changelog b/linhes/mythtv/__changelog
index b9c3591..e14ae82 100644
--- a/linhes/mythtv/__changelog
+++ b/linhes/mythtv/__changelog
@@ -1,4 +1,3 @@
 PKGBUILD: disable jack and remove dep
 PKGBUILD: move all opt deps to deps
-PKGBUILD: change CFLAGS, CXXFLAGS, and LDFLAGS to use fPIC due to ffmpeg build issue
 mythbackend.service: add --systemd-journal to exec
-- 
cgit v0.12

