From 6f86cf0e71f5d67cf0f719babdf2ca001a008cc6 Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Mon, 6 Aug 2012 17:38:29 -0500
Subject: dbus-core 1.6.4

---
 abs/core/dbus-core/PKGBUILD        |  58 +++---
 abs/core/dbus-core/__changelog     |   0
 abs/core/dbus-core/bug17754.patch  | 392 -------------------------------------
 abs/core/dbus-core/dbus            |  26 +--
 abs/core/dbus-core/dbus.install    |  17 +-
 abs/core/dbus-core/git-fixes.patch | 289 ---------------------------
 6 files changed, 46 insertions(+), 736 deletions(-)
 create mode 100644 abs/core/dbus-core/__changelog
 delete mode 100644 abs/core/dbus-core/bug17754.patch
 delete mode 100644 abs/core/dbus-core/git-fixes.patch

diff --git a/abs/core/dbus-core/PKGBUILD b/abs/core/dbus-core/PKGBUILD
index 78ac2f8..afca05e 100644
--- a/abs/core/dbus-core/PKGBUILD
+++ b/abs/core/dbus-core/PKGBUILD
@@ -1,56 +1,54 @@
-# $Id: PKGBUILD 90541 2010-09-13 10:46:30Z jgc $
+# $Id: PKGBUILD 163992 2012-07-23 14:58:38Z andyrtr $
 # Maintainer: Jan de Groot <jgc@archlinux.org>
 # Contributor: Link Dupont <link@subpop.net>
 #
 pkgname=dbus-core
-pkgver=1.4.0
+pkgver=1.6.4
 pkgrel=1
 pkgdesc="Freedesktop.org message bus system"
 url="http://www.freedesktop.org/Software/dbus"
 arch=(i686 x86_64)
 license=('GPL' 'custom')
-depends=('expat>=2.0.1' 'coreutils' 'filesystem')
-conflicts=('dbus<1.2.3-2')
+depends=('expat' 'coreutils' 'filesystem' 'libsystemd' 'shadow' 'systemd-tools') # shadow for install scriptlet FS#29341
+makedepends=('libx11')
 options=(!libtool)
 install=dbus.install
-source=(http://dbus.freedesktop.org/releases/dbus/dbus-${pkgver}.tar.gz
+source=(http://dbus.freedesktop.org/releases/dbus/dbus-$pkgver.tar.gz{,.asc}
         dbus)
-md5sums=('f59618b18d2fb2bd1fce9e1c5a2a3282'
-         '08f93dd19cffd1b45ab05c1fd4efb560')
+md5sums=('5ec43dc4554cba638917317b2b4f7640'
+         '3d4482ee39b49da334441c76f83bf1cb'
+         'f0364f3f5dc5f653bb05d39aa36e3264')
 
 build() {
-  cd "${srcdir}/dbus-${pkgver}"
+  cd dbus-$pkgver
   ./configure --prefix=/usr --sysconfdir=/etc --localstatedir=/var \
       --libexecdir=/usr/lib/dbus-1.0 --with-dbus-user=81 \
-      --with-system-pid-file=/var/run/dbus.pid \
+      --with-system-pid-file=/run/dbus/pid \
+      --with-system-socket=/run/dbus/system_bus_socket \
+      --with-console-auth-dir=/run/console/ \
       --enable-inotify --disable-dnotify \
       --disable-verbose-mode --disable-static \
-      --disable-tests --disable-asserts --without-x
-  make || return 1
+      --disable-tests --disable-asserts \
+      --with-systemdsystemunitdir=/usr/lib/systemd/system \
+      --enable-systemd
+  make
 }
-package() {
-  cd "${srcdir}/dbus-${pkgver}"
-  make DESTDIR="${pkgdir}" install
 
-  rm -f "${pkgdir}/usr/bin/dbus-launch"
-  rm -f "${pkgdir}/usr/share/man/man1/dbus-launch.1"
+package(){
+  cd dbus-$pkgver
+  make DESTDIR="$pkgdir" install
 
-  chown 81:81 "${pkgdir}/var/run/dbus"
+  rm -f "$pkgdir/usr/bin/dbus-launch"
+  rm -f "$pkgdir/usr/share/man/man1/dbus-launch.1"
+  rm -rf "$pkgdir/var/run"
 
-  install -m755 -d "${pkgdir}/etc/rc.d"
-  install -m755 "${srcdir}/dbus" "${pkgdir}/etc/rc.d/"
+  install -m755 -d "$pkgdir/etc/rc.d"
+  install -m755 ../dbus "$pkgdir/etc/rc.d/"
 
   #Fix configuration file
-  sed -i -e 's|<user>81</user>|<user>dbus</user>|' "${pkgdir}/etc/dbus-1/system.conf"
+  sed -i -e 's|<user>81</user>|<user>dbus</user>|' "$pkgdir/etc/dbus-1/system.conf"
 
-  #install .keep files so pacman doesn't delete empty dirs
-  touch "${pkgdir}/usr/share/dbus-1/services/.keep"
-  touch "${pkgdir}/usr/share/dbus-1/system-services/.keep"
-  touch "${pkgdir}/etc/dbus-1/session.d/.keep"
-  touch "${pkgdir}/etc/dbus-1/system.d/.keep"
-
-  rmdir "${pkgdir}/usr/lib/dbus-1.0/dbus-1"
-
-  install -d -m755 "${pkgdir}/usr/share/licenses/dbus-core"
-  install -m644 COPYING "${pkgdir}/usr/share/licenses/dbus-core/"
+  install -dm755 "$pkgdir/usr/share/licenses/dbus-core"
+  install -m644 COPYING "$pkgdir/usr/share/licenses/dbus-core/"
 }
+
diff --git a/abs/core/dbus-core/__changelog b/abs/core/dbus-core/__changelog
new file mode 100644
index 0000000..e69de29
diff --git a/abs/core/dbus-core/bug17754.patch b/abs/core/dbus-core/bug17754.patch
deleted file mode 100644
index 7f677ac..0000000
--- a/abs/core/dbus-core/bug17754.patch
+++ /dev/null
@@ -1,392 +0,0 @@
-diff --git a/dbus/dbus-connection.c b/dbus/dbus-connection.c
-index b3cfa3d..e6d261f 100644
---- a/dbus/dbus-connection.c
-+++ b/dbus/dbus-connection.c
-@@ -73,6 +73,14 @@
-     _dbus_mutex_unlock ((connection)->mutex);                                            \
-   } while (0)
- 
-+#define SLOTS_LOCK(connection) do {                     \
-+    _dbus_mutex_lock ((connection)->slot_mutex);        \
-+  } while (0)
-+
-+#define SLOTS_UNLOCK(connection) do {                   \
-+    _dbus_mutex_unlock ((connection)->slot_mutex);      \
-+  } while (0)
-+
- #define DISPATCH_STATUS_NAME(s)                                            \
-                      ((s) == DBUS_DISPATCH_COMPLETE ? "complete" :         \
-                       (s) == DBUS_DISPATCH_DATA_REMAINS ? "data remains" : \
-@@ -257,6 +265,7 @@ struct DBusConnection
-   
-   DBusList *filter_list;        /**< List of filters. */
- 
-+  DBusMutex *slot_mutex;        /**< Lock on slot_list so overall connection lock need not be taken */
-   DBusDataSlotList slot_list;   /**< Data stored by allocated integer ID */
- 
-   DBusHashTable *pending_replies;  /**< Hash of message serials to #DBusPendingCall. */  
-@@ -649,39 +658,42 @@ protected_change_watch (DBusConnection         *connection,
-                         DBusWatchToggleFunction toggle_function,
-                         dbus_bool_t             enabled)
- {
--  DBusWatchList *watches;
-   dbus_bool_t retval;
--  
-+
-   HAVE_LOCK_CHECK (connection);
- 
--  /* This isn't really safe or reasonable; a better pattern is the "do everything, then
--   * drop lock and call out" one; but it has to be propagated up through all callers
-+  /* The original purpose of protected_change_watch() was to hold a
-+   * ref on the connection while dropping the connection lock, then
-+   * calling out to the app.  This was a broken hack that did not
-+   * work, since the connection was in a hosed state (no WatchList
-+   * field) while calling out.
-+   *
-+   * So for now we'll just keep the lock while calling out. This means
-+   * apps are not allowed to call DBusConnection methods inside a
-+   * watch function or they will deadlock.
-+   *
-+   * The "real fix" is to use the _and_unlock() pattern found
-+   * elsewhere in the code, to defer calling out to the app until
-+   * we're about to drop locks and return flow of control to the app
-+   * anyway.
-+   *
-+   * See http://lists.freedesktop.org/archives/dbus/2007-July/thread.html#8144
-    */
--  
--  watches = connection->watches;
--  if (watches)
--    {
--      connection->watches = NULL;
--      _dbus_connection_ref_unlocked (connection);
--      CONNECTION_UNLOCK (connection);
- 
-+  if (connection->watches)
-+    {
-       if (add_function)
--        retval = (* add_function) (watches, watch);
-+        retval = (* add_function) (connection->watches, watch);
-       else if (remove_function)
-         {
-           retval = TRUE;
--          (* remove_function) (watches, watch);
-+          (* remove_function) (connection->watches, watch);
-         }
-       else
-         {
-           retval = TRUE;
--          (* toggle_function) (watches, watch, enabled);
-+          (* toggle_function) (connection->watches, watch, enabled);
-         }
--      
--      CONNECTION_LOCK (connection);
--      connection->watches = watches;
--      _dbus_connection_unref_unlocked (connection);
--
-       return retval;
-     }
-   else
-@@ -770,39 +782,42 @@ protected_change_timeout (DBusConnection           *connection,
-                           DBusTimeoutToggleFunction toggle_function,
-                           dbus_bool_t               enabled)
- {
--  DBusTimeoutList *timeouts;
-   dbus_bool_t retval;
--  
-+
-   HAVE_LOCK_CHECK (connection);
- 
--  /* This isn't really safe or reasonable; a better pattern is the "do everything, then
--   * drop lock and call out" one; but it has to be propagated up through all callers
-+  /* The original purpose of protected_change_timeout() was to hold a
-+   * ref on the connection while dropping the connection lock, then
-+   * calling out to the app.  This was a broken hack that did not
-+   * work, since the connection was in a hosed state (no TimeoutList
-+   * field) while calling out.
-+   *
-+   * So for now we'll just keep the lock while calling out. This means
-+   * apps are not allowed to call DBusConnection methods inside a
-+   * timeout function or they will deadlock.
-+   *
-+   * The "real fix" is to use the _and_unlock() pattern found
-+   * elsewhere in the code, to defer calling out to the app until
-+   * we're about to drop locks and return flow of control to the app
-+   * anyway.
-+   *
-+   * See http://lists.freedesktop.org/archives/dbus/2007-July/thread.html#8144
-    */
--  
--  timeouts = connection->timeouts;
--  if (timeouts)
--    {
--      connection->timeouts = NULL;
--      _dbus_connection_ref_unlocked (connection);
--      CONNECTION_UNLOCK (connection);
- 
-+  if (connection->timeouts)
-+    {
-       if (add_function)
--        retval = (* add_function) (timeouts, timeout);
-+        retval = (* add_function) (connection->timeouts, timeout);
-       else if (remove_function)
-         {
-           retval = TRUE;
--          (* remove_function) (timeouts, timeout);
-+          (* remove_function) (connection->timeouts, timeout);
-         }
-       else
-         {
-           retval = TRUE;
--          (* toggle_function) (timeouts, timeout, enabled);
-+          (* toggle_function) (connection->timeouts, timeout, enabled);
-         }
--      
--      CONNECTION_LOCK (connection);
--      connection->timeouts = timeouts;
--      _dbus_connection_unref_unlocked (connection);
--
-       return retval;
-     }
-   else
-@@ -1263,6 +1278,10 @@ _dbus_connection_new_for_transport (DBusTransport *transport)
-   if (connection->io_path_cond == NULL)
-     goto error;
- 
-+  _dbus_mutex_new_at_location (&connection->slot_mutex);
-+  if (connection->slot_mutex == NULL)
-+    goto error;
-+
-   disconnect_message = dbus_message_new_signal (DBUS_PATH_LOCAL,
-                                                 DBUS_INTERFACE_LOCAL,
-                                                 "Disconnected");
-@@ -1339,6 +1358,7 @@ _dbus_connection_new_for_transport (DBusTransport *transport)
-       _dbus_mutex_free_at_location (&connection->mutex);
-       _dbus_mutex_free_at_location (&connection->io_path_mutex);
-       _dbus_mutex_free_at_location (&connection->dispatch_mutex);
-+      _dbus_mutex_free_at_location (&connection->slot_mutex);
-       dbus_free (connection);
-     }
-   if (pending_replies)
-@@ -2612,9 +2632,14 @@ dbus_connection_ref (DBusConnection *connection)
-   
-   /* The connection lock is better than the global
-    * lock in the atomic increment fallback
-+   *
-+   * (FIXME but for now we always use the atomic version,
-+   * to avoid taking the connection lock, due to
-+   * the mess with set_timeout_functions()/set_watch_functions()
-+   * calling out to the app without dropping locks)
-    */
-   
--#ifdef DBUS_HAVE_ATOMIC_INT
-+#if 1
-   _dbus_atomic_inc (&connection->refcount);
- #else
-   CONNECTION_LOCK (connection);
-@@ -2726,6 +2751,8 @@ _dbus_connection_last_unref (DBusConnection *connection)
-   _dbus_mutex_free_at_location (&connection->io_path_mutex);
-   _dbus_mutex_free_at_location (&connection->dispatch_mutex);
- 
-+  _dbus_mutex_free_at_location (&connection->slot_mutex);
-+
-   _dbus_mutex_free_at_location (&connection->mutex);
-   
-   dbus_free (connection);
-@@ -2760,9 +2787,14 @@ dbus_connection_unref (DBusConnection *connection)
-   
-   /* The connection lock is better than the global
-    * lock in the atomic increment fallback
-+   *
-+   * (FIXME but for now we always use the atomic version,
-+   * to avoid taking the connection lock, due to
-+   * the mess with set_timeout_functions()/set_watch_functions()
-+   * calling out to the app without dropping locks)
-    */
-   
--#ifdef DBUS_HAVE_ATOMIC_INT
-+#if 1
-   last_unref = (_dbus_atomic_dec (&connection->refcount) == 1);
- #else
-   CONNECTION_LOCK (connection);
-@@ -4708,9 +4740,11 @@ dbus_connection_dispatch (DBusConnection *connection)
-  * should be that dbus_connection_set_watch_functions() has no effect,
-  * but the add_function and remove_function may have been called.
-  *
-- * @todo We need to drop the lock when we call the
-- * add/remove/toggled functions which can be a side effect
-- * of setting the watch functions.
-+ * @note The thread lock on DBusConnection is held while
-+ * watch functions are invoked, so inside these functions you
-+ * may not invoke any methods on DBusConnection or it will deadlock.
-+ * See the comments in the code or http://lists.freedesktop.org/archives/dbus/2007-July/tread.html#8144
-+ * if you encounter this issue and want to attempt writing a patch.
-  * 
-  * @param connection the connection.
-  * @param add_function function to begin monitoring a new descriptor.
-@@ -4729,43 +4763,18 @@ dbus_connection_set_watch_functions (DBusConnection              *connection,
-                                      DBusFreeFunction             free_data_function)
- {
-   dbus_bool_t retval;
--  DBusWatchList *watches;
- 
-   _dbus_return_val_if_fail (connection != NULL, FALSE);
-   
-   CONNECTION_LOCK (connection);
- 
--#ifndef DBUS_DISABLE_CHECKS
--  if (connection->watches == NULL)
--    {
--      _dbus_warn_check_failed ("Re-entrant call to %s is not allowed\n",
--                               _DBUS_FUNCTION_NAME);
--      return FALSE;
--    }
--#endif
--  
--  /* ref connection for slightly better reentrancy */
--  _dbus_connection_ref_unlocked (connection);
--
--  /* This can call back into user code, and we need to drop the
--   * connection lock when it does. This is kind of a lame
--   * way to do it.
--   */
--  watches = connection->watches;
--  connection->watches = NULL;
--  CONNECTION_UNLOCK (connection);
--
--  retval = _dbus_watch_list_set_functions (watches,
-+  retval = _dbus_watch_list_set_functions (connection->watches,
-                                            add_function, remove_function,
-                                            toggled_function,
-                                            data, free_data_function);
--  CONNECTION_LOCK (connection);
--  connection->watches = watches;
--  
-+
-   CONNECTION_UNLOCK (connection);
--  /* drop our paranoid refcount */
--  dbus_connection_unref (connection);
--  
-+
-   return retval;
- }
- 
-@@ -4794,6 +4803,12 @@ dbus_connection_set_watch_functions (DBusConnection              *connection,
-  * given remove_function.  The timer interval may change whenever the
-  * timeout is added, removed, or toggled.
-  *
-+ * @note The thread lock on DBusConnection is held while
-+ * timeout functions are invoked, so inside these functions you
-+ * may not invoke any methods on DBusConnection or it will deadlock.
-+ * See the comments in the code or http://lists.freedesktop.org/archives/dbus/2007-July/thread.html#8144
-+ * if you encounter this issue and want to attempt writing a patch.
-+ *
-  * @param connection the connection.
-  * @param add_function function to add a timeout.
-  * @param remove_function function to remove a timeout.
-@@ -4811,38 +4826,17 @@ dbus_connection_set_timeout_functions   (DBusConnection            *connection,
- 					 DBusFreeFunction           free_data_function)
- {
-   dbus_bool_t retval;
--  DBusTimeoutList *timeouts;
- 
-   _dbus_return_val_if_fail (connection != NULL, FALSE);
-   
-   CONNECTION_LOCK (connection);
- 
--#ifndef DBUS_DISABLE_CHECKS
--  if (connection->timeouts == NULL)
--    {
--      _dbus_warn_check_failed ("Re-entrant call to %s is not allowed\n",
--                               _DBUS_FUNCTION_NAME);
--      return FALSE;
--    }
--#endif
--  
--  /* ref connection for slightly better reentrancy */
--  _dbus_connection_ref_unlocked (connection);
--
--  timeouts = connection->timeouts;
--  connection->timeouts = NULL;
--  CONNECTION_UNLOCK (connection);
--  
--  retval = _dbus_timeout_list_set_functions (timeouts,
-+  retval = _dbus_timeout_list_set_functions (connection->timeouts,
-                                              add_function, remove_function,
-                                              toggled_function,
-                                              data, free_data_function);
--  CONNECTION_LOCK (connection);
--  connection->timeouts = timeouts;
--  
-+
-   CONNECTION_UNLOCK (connection);
--  /* drop our paranoid refcount */
--  dbus_connection_unref (connection);
- 
-   return retval;
- }
-@@ -5805,6 +5799,15 @@ dbus_connection_free_data_slot (dbus_int32_t *slot_p)
-  * the connection is finalized. The slot number
-  * must have been allocated with dbus_connection_allocate_data_slot().
-  *
-+ * @note This function does not take the
-+ * main thread lock on DBusConnection, which allows it to be
-+ * used from inside watch and timeout functions. (See the
-+ * note in docs for dbus_connection_set_watch_functions().)
-+ * A side effect of this is that you need to know there's
-+ * a reference held on the connection while invoking
-+ * dbus_connection_set_data(), or the connection could be
-+ * finalized during dbus_connection_set_data().
-+ *
-  * @param connection the connection
-  * @param slot the slot number
-  * @param data the data to store
-@@ -5824,14 +5827,14 @@ dbus_connection_set_data (DBusConnection   *connection,
-   _dbus_return_val_if_fail (connection != NULL, FALSE);
-   _dbus_return_val_if_fail (slot >= 0, FALSE);
-   
--  CONNECTION_LOCK (connection);
-+  SLOTS_LOCK (connection);
- 
-   retval = _dbus_data_slot_list_set (&slot_allocator,
-                                      &connection->slot_list,
-                                      slot, data, free_data_func,
-                                      &old_free_func, &old_data);
-   
--  CONNECTION_UNLOCK (connection);
-+  SLOTS_UNLOCK (connection);
- 
-   if (retval)
-     {
-@@ -5847,6 +5850,15 @@ dbus_connection_set_data (DBusConnection   *connection,
-  * Retrieves data previously set with dbus_connection_set_data().
-  * The slot must still be allocated (must not have been freed).
-  *
-+ * @note This function does not take the
-+ * main thread lock on DBusConnection, which allows it to be
-+ * used from inside watch and timeout functions. (See the
-+ * note in docs for dbus_connection_set_watch_functions().)
-+ * A side effect of this is that you need to know there's
-+ * a reference held on the connection while invoking
-+ * dbus_connection_get_data(), or the connection could be
-+ * finalized during dbus_connection_get_data().
-+ *
-  * @param connection the connection
-  * @param slot the slot to get data from
-  * @returns the data, or #NULL if not found
-@@ -5859,13 +5871,13 @@ dbus_connection_get_data (DBusConnection   *connection,
- 
-   _dbus_return_val_if_fail (connection != NULL, NULL);
-   
--  CONNECTION_LOCK (connection);
-+  SLOTS_LOCK (connection);
- 
-   res = _dbus_data_slot_list_get (&slot_allocator,
-                                   &connection->slot_list,
-                                   slot);
-   
--  CONNECTION_UNLOCK (connection);
-+  SLOTS_UNLOCK (connection);
- 
-   return res;
- }
diff --git a/abs/core/dbus-core/dbus b/abs/core/dbus-core/dbus
index 66b84ca..bf532a2 100644
--- a/abs/core/dbus-core/dbus
+++ b/abs/core/dbus-core/dbus
@@ -4,18 +4,14 @@
 . /etc/rc.conf
 . /etc/rc.d/functions
 
-case "$1" in
+case $1 in
     start)
         stat_busy "Starting D-BUS system messagebus"
-	if [ ! -x /var/run/dbus ] ; then
-	    install -m755 -g 81 -o 81 -d /var/run/dbus
-	fi
-        if [ -x /usr/bin/dbus-uuidgen ] ; then
-            /usr/bin/dbus-uuidgen --ensure
+        if [[ ! -d /run/dbus ]] ; then
+            install -m755 -g 81 -o 81 -d /run/dbus
         fi
 
-        /usr/bin/dbus-daemon --system
-        if [ $? -gt 0 ]; then
+        if ! dbus-daemon --system; then
             stat_fail
         else
             add_daemon dbus
@@ -24,27 +20,25 @@ case "$1" in
         ;;
     stop)
         stat_busy "Stopping D-BUS system messagebus"
-	[ -f /var/run/dbus.pid ] && kill `cat /var/run/dbus.pid` >/dev/null 2>&1
-        if [ $? -gt 0 ]; then
+        if ! { [[ -f /run/dbus/pid ]] && kill $(</run/dbus/pid); }; then
             stat_fail
         else
-	    rm -f /var/run/dbus.pid
+            rm -f /run/dbus/pid
             rm_daemon dbus
             stat_done
         fi
         ;;
     restart)
         $0 stop
-	sleep 1
+        sleep 1
         $0 start
         ;;
     reload)
         stat_busy "Reloading D-BUS configuration"
-        [ -f /var/run/dbus.pid ] && /usr/bin/dbus-send \
+        if ! { [[ -f /run/dbus/pid ]] && dbus-send \
                 --system --type=method_call \
                 --dest=org.freedesktop.DBus \
-                / org.freedesktop.DBus.ReloadConfig
-        if [ $? -gt 0 ]; then
+                / org.freedesktop.DBus.ReloadConfig; }; then
             stat_fail
         else
             stat_done
@@ -52,6 +46,6 @@ case "$1" in
         ;;
     *)
         echo "usage: $0 {start|stop|restart|reload}"
-	;;
+        ;;
 esac
 exit 0
diff --git a/abs/core/dbus-core/dbus.install b/abs/core/dbus-core/dbus.install
index 44f4475..f1ffd61 100644
--- a/abs/core/dbus-core/dbus.install
+++ b/abs/core/dbus-core/dbus.install
@@ -1,24 +1,23 @@
 post_install() {
-  getent group dbus >/dev/null || usr/sbin/groupadd -g 81 dbus
-  getent passwd dbus >/dev/null || usr/sbin/useradd -c 'System message bus' -u 81 -g dbus -d '/' -s /bin/false dbus
-  usr/bin/passwd -l dbus &>/dev/null
-  dbus-uuidgen --ensure
+  getent group dbus >/dev/null || groupadd -g 81 dbus
+  getent passwd dbus >/dev/null || useradd -c 'System message bus' -u 81 -g dbus -d '/' -s /bin/false dbus
+  passwd -l dbus &>/dev/null
 }
 
 post_upgrade() {
   post_install
 
-  #Make sure new rc script can shutdown running dbus
-  if [ -f var/run/dbus/pid ]; then
-    mv var/run/dbus/pid var/run/dbus.pid
+  # Make sure new rc script can shutdown running dbus
+  if [ -f run/dbus.pid -a -d run/dbus ]; then
+    mv run/dbus.pid run/dbus/pid
   fi
 }
 
 post_remove() {
   if getent passwd dbus >/dev/null; then
-    usr/sbin/userdel dbus
+    userdel dbus
   fi
   if getent group dbus >/dev/null; then
-    usr/sbin/groupdel dbus
+    groupdel dbus
   fi
 }
diff --git a/abs/core/dbus-core/git-fixes.patch b/abs/core/dbus-core/git-fixes.patch
deleted file mode 100644
index b1b11fa..0000000
--- a/abs/core/dbus-core/git-fixes.patch
+++ /dev/null
@@ -1,289 +0,0 @@
-diff --git a/bus/config-parser-trivial.c b/bus/config-parser-trivial.c
-index fd016a8..8a1f504 100644
---- a/bus/config-parser-trivial.c
-+++ b/bus/config-parser-trivial.c
-@@ -131,6 +131,25 @@ bus_config_parser_unref (BusConfigParser *parser)
- }
- 
- dbus_bool_t
-+bus_config_parser_check_doctype (BusConfigParser   *parser,
-+                                 const char        *doctype,
-+                                 DBusError         *error)
-+{
-+  _DBUS_ASSERT_ERROR_IS_CLEAR (error);
-+
-+  if (strcmp (doctype, "busconfig") != 0)
-+    {
-+      dbus_set_error (error,
-+                      DBUS_ERROR_FAILED,
-+                      "Configuration file has the wrong document type %s",
-+                      doctype);
-+      return FALSE;
-+    }
-+  else
-+    return TRUE;
-+}
-+
-+dbus_bool_t
- bus_config_parser_start_element (BusConfigParser   *parser,
-                                  const char        *element_name,
-                                  const char       **attribute_names,
-diff --git a/bus/config-parser-trivial.h b/bus/config-parser-trivial.h
-index ce542bf..6733b1f 100644
---- a/bus/config-parser-trivial.h
-+++ b/bus/config-parser-trivial.h
-@@ -41,6 +41,9 @@ BusConfigParser* bus_config_parser_new (const DBusString      *basedir,
- 
- BusConfigParser* bus_config_parser_ref           (BusConfigParser   *parser);
- void             bus_config_parser_unref         (BusConfigParser   *parser);
-+dbus_bool_t      bus_config_parser_check_doctype (BusConfigParser   *parser,
-+                                                  const char        *doctype,
-+                                                  DBusError         *error);
- dbus_bool_t      bus_config_parser_start_element (BusConfigParser   *parser,
-                                                   const char        *element_name,
-                                                   const char       **attribute_names,
-diff --git a/bus/dir-watch-kqueue.c b/bus/dir-watch-kqueue.c
-index 4a01b74..4e436eb 100644
---- a/bus/dir-watch-kqueue.c
-+++ b/bus/dir-watch-kqueue.c
-@@ -169,7 +169,7 @@ bus_set_watched_dirs (BusContext *context, DBusList **directories)
-    */
-   for (i = 0; new_dirs[i]; i++)
-     {
--      for (j = 0; i < num_fds; j++)
-+      for (j = 0; j < num_fds; j++)
-         {
-           if (dirs[j] && strcmp (new_dirs[i], dirs[j]) == 0)
-             {
-diff --git a/bus/messagebus.in b/bus/messagebus.in
-index 1f1004b..3e2ee07 100755
---- a/bus/messagebus.in
-+++ b/bus/messagebus.in
-@@ -68,7 +68,7 @@ case "$1" in
-         stop
-         ;;
-     status)
--        status $processname
-+        status $servicename
-         RETVAL=$?
-         ;;
-     restart)
-diff --git a/bus/rc.messagebus.in b/bus/rc.messagebus.in
-index b147503..c52ca77 100644
---- a/bus/rc.messagebus.in
-+++ b/bus/rc.messagebus.in
-@@ -61,7 +61,7 @@ case "$1" in
-         stop
-         ;;
-     status)
--        status $processname
-+        status $servicename
-         RETVAL=$?
-         ;;
-     restart)
-diff --git a/dbus/dbus-connection-internal.h b/dbus/dbus-connection-internal.h
-index 721b5d7..cdf3f59 100644
---- a/dbus/dbus-connection-internal.h
-+++ b/dbus/dbus-connection-internal.h
-@@ -75,6 +75,7 @@ void              _dbus_connection_toggle_timeout_unlocked     (DBusConnection
-                                                                 dbus_bool_t         enabled);
- DBusConnection*   _dbus_connection_new_for_transport           (DBusTransport      *transport);
- void              _dbus_connection_do_iteration_unlocked       (DBusConnection     *connection,
-+                                                                DBusPendingCall    *pending,
-                                                                 unsigned int        flags,
-                                                                 int                 timeout_milliseconds);
- void              _dbus_connection_close_possibly_shared       (DBusConnection     *connection);
-diff --git a/dbus/dbus-connection.c b/dbus/dbus-connection.c
-index 9526d3c..b3cfa3d 100644
---- a/dbus/dbus-connection.c
-+++ b/dbus/dbus-connection.c
-@@ -320,6 +320,8 @@ static void               _dbus_connection_release_dispatch                  (DB
- static DBusDispatchStatus _dbus_connection_flush_unlocked                    (DBusConnection     *connection);
- static void               _dbus_connection_close_possibly_shared_and_unlock  (DBusConnection     *connection);
- static dbus_bool_t        _dbus_connection_get_is_connected_unlocked         (DBusConnection     *connection);
-+static dbus_bool_t        _dbus_connection_peek_for_reply_unlocked           (DBusConnection     *connection,
-+                                                                              dbus_uint32_t       client_serial);
- 
- static DBusMessageFilter *
- _dbus_message_filter_ref (DBusMessageFilter *filter)
-@@ -1137,14 +1139,22 @@ _dbus_connection_release_io_path (DBusConnection *connection)
-  * you specify DBUS_ITERATION_BLOCK; in that case the function
-  * returns immediately.
-  *
-+ * If pending is not NULL then a check is made if the pending call
-+ * is completed after the io path has been required. If the call
-+ * has been completed nothing is done. This must be done since
-+ * the _dbus_connection_acquire_io_path releases the connection
-+ * lock for a while.
-+ *
-  * Called with connection lock held.
-  * 
-  * @param connection the connection.
-+ * @param pending the pending call that should be checked or NULL
-  * @param flags iteration flags.
-  * @param timeout_milliseconds maximum blocking time, or -1 for no limit.
-  */
- void
- _dbus_connection_do_iteration_unlocked (DBusConnection *connection,
-+                                        DBusPendingCall *pending,
-                                         unsigned int    flags,
-                                         int             timeout_milliseconds)
- {
-@@ -1160,8 +1170,22 @@ _dbus_connection_do_iteration_unlocked (DBusConnection *connection,
-     {
-       HAVE_LOCK_CHECK (connection);
-       
--      _dbus_transport_do_iteration (connection->transport,
--				    flags, timeout_milliseconds);
-+      if ( (pending != NULL) && _dbus_pending_call_get_completed_unlocked(pending))
-+        {
-+          _dbus_verbose ("pending call completed while acquiring I/O path");
-+        }
-+      else if ( (pending != NULL) &&
-+                _dbus_connection_peek_for_reply_unlocked (connection,
-+                                                          _dbus_pending_call_get_reply_serial_unlocked (pending)))
-+        {
-+          _dbus_verbose ("pending call completed while acquiring I/O path (reply found in queue)");
-+        }
-+      else
-+        {
-+          _dbus_transport_do_iteration (connection->transport,
-+                                        flags, timeout_milliseconds);
-+        }
-+
-       _dbus_connection_release_io_path (connection);
-     }
- 
-@@ -1989,6 +2013,7 @@ _dbus_connection_send_preallocated_unlocked_no_update (DBusConnection       *con
-    * out immediately, and otherwise get them queued up
-    */
-   _dbus_connection_do_iteration_unlocked (connection,
-+                                          NULL,
-                                           DBUS_ITERATION_DO_WRITING,
-                                           -1);
- 
-@@ -2157,6 +2182,32 @@ generate_local_error_message (dbus_uint32_t serial,
-   return message;
- }
- 
-+/*
-+ * Peek the incoming queue to see if we got reply for a specific serial
-+ */
-+static dbus_bool_t
-+_dbus_connection_peek_for_reply_unlocked (DBusConnection *connection,
-+                                          dbus_uint32_t   client_serial)
-+{
-+  DBusList *link;
-+  HAVE_LOCK_CHECK (connection);
-+
-+  link = _dbus_list_get_first_link (&connection->incoming_messages);
-+
-+  while (link != NULL)
-+    {
-+      DBusMessage *reply = link->data;
-+
-+      if (dbus_message_get_reply_serial (reply) == client_serial)
-+        {
-+          _dbus_verbose ("%s reply to %d found in queue\n", _DBUS_FUNCTION_NAME, client_serial);
-+          return TRUE;
-+        }
-+      link = _dbus_list_get_next_link (&connection->incoming_messages, link);
-+    }
-+
-+  return FALSE;
-+}
- 
- /* This is slightly strange since we can pop a message here without
-  * the dispatch lock.
-@@ -2333,6 +2384,7 @@ _dbus_connection_block_pending_call (DBusPendingCall *pending)
-   /* Now we wait... */
-   /* always block at least once as we know we don't have the reply yet */
-   _dbus_connection_do_iteration_unlocked (connection,
-+                                          pending,
-                                           DBUS_ITERATION_DO_READING |
-                                           DBUS_ITERATION_BLOCK,
-                                           timeout_milliseconds);
-@@ -2399,6 +2451,7 @@ _dbus_connection_block_pending_call (DBusPendingCall *pending)
-         {          
-           /* block again, we don't have the reply buffered yet. */
-           _dbus_connection_do_iteration_unlocked (connection,
-+                                                  pending,
-                                                   DBUS_ITERATION_DO_READING |
-                                                   DBUS_ITERATION_BLOCK,
-                                                   timeout_milliseconds - elapsed_milliseconds);
-@@ -2426,6 +2479,7 @@ _dbus_connection_block_pending_call (DBusPendingCall *pending)
-         {          
-           /* block again, we don't have the reply buffered yet. */
-           _dbus_connection_do_iteration_unlocked (connection,
-+                                                  NULL,
-                                                   DBUS_ITERATION_DO_READING |
-                                                   DBUS_ITERATION_BLOCK,
-                                                   timeout_milliseconds - elapsed_milliseconds);
-@@ -3403,6 +3457,7 @@ _dbus_connection_flush_unlocked (DBusConnection *connection)
-       _dbus_verbose ("doing iteration in %s\n", _DBUS_FUNCTION_NAME);
-       HAVE_LOCK_CHECK (connection);
-       _dbus_connection_do_iteration_unlocked (connection,
-+                                              NULL,
-                                               DBUS_ITERATION_DO_READING |
-                                               DBUS_ITERATION_DO_WRITING |
-                                               DBUS_ITERATION_BLOCK,
-@@ -3489,6 +3544,7 @@ _dbus_connection_read_write_dispatch (DBusConnection *connection,
-         {
-           _dbus_verbose ("doing iteration in %s\n", _DBUS_FUNCTION_NAME);
-           _dbus_connection_do_iteration_unlocked (connection,
-+                                                  NULL,
-                                                   DBUS_ITERATION_DO_READING |
-                                                   DBUS_ITERATION_DO_WRITING |
-                                                   DBUS_ITERATION_BLOCK,
-diff --git a/dbus/dbus-sysdeps-unix.c b/dbus/dbus-sysdeps-unix.c
-index ce3475a..b58d09a 100644
---- a/dbus/dbus-sysdeps-unix.c
-+++ b/dbus/dbus-sysdeps-unix.c
-@@ -623,6 +623,7 @@ _dbus_listen_unix_socket (const char     *path,
-   int listen_fd;
-   struct sockaddr_un addr;
-   size_t path_len;
-+  unsigned int reuseaddr;
- 
-   _DBUS_ASSERT_ERROR_IS_CLEAR (error);
- 
-@@ -696,7 +697,15 @@ _dbus_listen_unix_socket (const char     *path,
- 	
-       strncpy (addr.sun_path, path, path_len);
-     }
--  
-+
-+  reuseaddr = 1;
-+  if (setsockopt  (listen_fd, SOL_SOCKET, SO_REUSEADDR, &reuseaddr, sizeof(reuseaddr))==-1)
-+    {
-+      dbus_set_error (error, _dbus_error_from_errno (errno),
-+                      "Failed to set socket option\"%s\": %s",
-+                      path, _dbus_strerror (errno));
-+    }
-+
-   if (bind (listen_fd, (struct sockaddr*) &addr, _DBUS_STRUCT_OFFSET (struct sockaddr_un, sun_path) + path_len) < 0)
-     {
-       dbus_set_error (error, _dbus_error_from_errno (errno),
-@@ -870,6 +879,7 @@ _dbus_listen_tcp_socket (const char     *host,
-   int nlisten_fd = 0, *listen_fd = NULL, res, i;
-   struct addrinfo hints;
-   struct addrinfo *ai, *tmp;
-+  unsigned int reuseaddr;
- 
-   *fds_p = NULL;
-   _DBUS_ASSERT_ERROR_IS_CLEAR (error);
-@@ -915,6 +925,14 @@ _dbus_listen_tcp_socket (const char     *host,
-         }
-       _DBUS_ASSERT_ERROR_IS_CLEAR(error);
- 
-+      reuseaddr = 1;
-+      if (setsockopt (fd, SOL_SOCKET, SO_REUSEADDR, &reuseaddr, sizeof(reuseaddr))==-1)
-+        {
-+          dbus_set_error (error, _dbus_error_from_errno (errno),
-+                          "Failed to set socket option \"%s:%s\": %s",
-+                          host ? host : "*", port, _dbus_strerror (errno));
-+        }
-+
-       if (bind (fd, (struct sockaddr*) tmp->ai_addr, tmp->ai_addrlen) < 0)
-         {
-           _dbus_close(fd, NULL);
-- 
cgit v0.12

