From 07d0be031e4db6460d6c22cb3775cd2e977e163e Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Thu, 4 Jun 2009 10:09:41 -0500
Subject: linhes-config:  add several service calls for sv restart lcdd using
 the the service calls

---
 abs/core-testing/LinHES-config/mv_common.py | 32 ++++++++++++++++++++++++++++-
 abs/core-testing/LinHES-config/mv_ir.py     |  1 +
 2 files changed, 32 insertions(+), 1 deletion(-)

diff --git a/abs/core-testing/LinHES-config/mv_common.py b/abs/core-testing/LinHES-config/mv_common.py
index 64ff2d6..0cbabf5 100755
--- a/abs/core-testing/LinHES-config/mv_common.py
+++ b/abs/core-testing/LinHES-config/mv_common.py
@@ -1,5 +1,5 @@
 # -*- coding: utf-8 -*-
-import logging, os
+import logging, os, time
 import commands
 config_file = "mv_config"
 data_config = __import__(config_file, globals(), locals(), [])
@@ -37,6 +37,36 @@ def remove_service(daemon):
     cmd = "remove_service.sh %s" %daemon
     runcmd(cmd)
 
+def start_service(daemon):
+    logging.info("    start service %s",daemon)
+    cmd = "sv start %s" %daemon
+    runcmd(cmd)
+
+def stop_service(daemon):
+    logging.info("    stop service %s",daemon)
+    cmd = "sv stop %s" %daemon
+    runcmd(cmd)
+
+def restart_service(daemon):
+    logging.info("    Restarting service %s",daemon)
+    if daemon == "lcdd":
+        stop_service(daemon)
+        logging.debug("    killing all lcdd")
+        cmd = "killall -9 LCDd"
+        runcmd(cmd)
+        time.sleep(2)
+        start_service(daemon)
+    else:
+        cmd = "sv restart %s" %daemon
+        runcmd(cmd)
+
+def hup_service(daemon):
+    logging.info("    hup service %s",daemon)
+    cmd = "sv hup %s" %daemon
+    runcmd(cmd)
+
+
+
 def pkg_blacklist_check(pkg):
     cmd = '''grep -q %s /etc/blacklist.package''' %pkg
     rc = runcmd(cmd)
diff --git a/abs/core-testing/LinHES-config/mv_ir.py b/abs/core-testing/LinHES-config/mv_ir.py
index 6c2b2aa..6ce549f 100755
--- a/abs/core-testing/LinHES-config/mv_ir.py
+++ b/abs/core-testing/LinHES-config/mv_ir.py
@@ -248,6 +248,7 @@ def setup_lcd(LCDtype, TEMPLATES, Remotetype):
                 mv_common.runcmd(cmd)
 
             mv_common.add_service("lcdd")
+            mv_common.restart_service("lcdd")
     logging.debug("__End of setup_lcd")
 
 def setup_ir(systemconfig, data_config):
-- 
cgit v0.12

