From 09c383a1b8e939938600ff1bc7f740a8393de5c3 Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Sun, 30 Nov 2008 18:48:01 -0600
Subject: drop font size so LinHES title fits on screen

---
 abs/core-testing/LinHES-config/PKGBUILD       | 2 +-
 abs/core-testing/LinHES-config/install-ui.xml | 2 +-
 2 files changed, 2 insertions(+), 2 deletions(-)

diff --git a/abs/core-testing/LinHES-config/PKGBUILD b/abs/core-testing/LinHES-config/PKGBUILD
index 71dd8ba..c7a2dbf 100755
--- a/abs/core-testing/LinHES-config/PKGBUILD
+++ b/abs/core-testing/LinHES-config/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=LinHES-config
 pkgver=1.0
-pkgrel=46
+pkgrel=47
 conflicts=(MythVantage-config MythVantage-config-dev LinHES-config-dev )
 pkgdesc="Install and configure your system"
 depends=(bc libstatgrab  mysql-python expect curl dnsutils parted sg3_utils nmbscan hwd)
diff --git a/abs/core-testing/LinHES-config/install-ui.xml b/abs/core-testing/LinHES-config/install-ui.xml
index b7a67de..2b3a043 100755
--- a/abs/core-testing/LinHES-config/install-ui.xml
+++ b/abs/core-testing/LinHES-config/install-ui.xml
@@ -17,7 +17,7 @@
        <font name="title" face="Arial">
            <color>#ffff00</color>
            <dropcolor>#000000</dropcolor>
-           <size>22</size>
+           <size>20</size>
            <shadow>3,3</shadow>
            <bold>yes</bold>
        </font>
-- 
cgit v0.12

