From 0f2c56869ac05a79872dd87cc19c7b3360057150 Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Thu, 26 Feb 2009 19:18:11 -0600
Subject: Remove commented line not needed by linhes. Besides it had a typo in
 it as pointed out by Mr Hanson.

---
 abs/core-testing/runit-scripts/PKGBUILD       | 2 +-
 abs/core-testing/runit-scripts/runitscripts/1 | 1 -
 2 files changed, 1 insertion(+), 2 deletions(-)

diff --git a/abs/core-testing/runit-scripts/PKGBUILD b/abs/core-testing/runit-scripts/PKGBUILD
index 63f061e..1b74888 100755
--- a/abs/core-testing/runit-scripts/PKGBUILD
+++ b/abs/core-testing/runit-scripts/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=runit-scripts
 pkgver=1.8.0
-pkgrel=33
+pkgrel=34
 pkgdesc="collection of startup scripts for runit"
 url="http://smarden.org/runit/"
 license="BSD"
diff --git a/abs/core-testing/runit-scripts/runitscripts/1 b/abs/core-testing/runit-scripts/runitscripts/1
index b9ff184..ac1ac49 100755
--- a/abs/core-testing/runit-scripts/runitscripts/1
+++ b/abs/core-testing/runit-scripts/runitscripts/1
@@ -11,4 +11,3 @@ rm -f /etc/runit/reboot 2>/dev/null
 /usr/sbin/ethtool -s  eth1 wol g 2>/dev/null
 /usr/sbin/ethtool -s  eth2 wol g 2>/dev/null
 
-#/bin/su mythtv -c /usr/bin/grabkey.py 2>/dev/null 1>/devn/null &
-- 
cgit v0.12

