From 3922b1dcb14ff2c510b53cb4c72b52067fe72814 Mon Sep 17 00:00:00 2001
From: Nathan Harris <nharris@eoimaging.com>
Date: Sat, 18 Jul 2009 11:09:40 -0400
Subject: libcups: rebuild

---
 abs/core-testing/libcups/PKGBUILD | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

diff --git a/abs/core-testing/libcups/PKGBUILD b/abs/core-testing/libcups/PKGBUILD
index d2a9d5a..9b31bd0 100644
--- a/abs/core-testing/libcups/PKGBUILD
+++ b/abs/core-testing/libcups/PKGBUILD
@@ -3,14 +3,14 @@
 
 pkgname=libcups
 pkgver=1.3.9
-pkgrel=3
+pkgrel=4
 pkgdesc="The CUPS Printing System"
 arch=('i686' 'x86_64')
 license=('GPL')
 url="http://www.cups.org/"
 depends=('gnutls>=2.4.1' 'libtiff' 'libpng' 'heimdal>=1.2')
 source=(ftp://ftp.easysw.com/pub/cups/${pkgver}/cups-${pkgver}-source.tar.bz2)
-md5sums=('cf63f451c356e6cabb08972d4d11c365')
+md5sums=('72430b36094cf587cf2e0087047d5643')
 
 build() {
   cd ${srcdir}/cups-${pkgver}
-- 
cgit v0.12

