From 8aaf1c6cb3aca9ee0c95b9b5464c6fa40587e56b Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Thu, 8 Jan 2009 11:14:10 -0600
Subject: new mythvantage.app that places locks around the install buttons.
 This will prevent to installs from running at the same time. closes FS#81

---
 abs/core-testing/LinHES-config/PKGBUILD | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

diff --git a/abs/core-testing/LinHES-config/PKGBUILD b/abs/core-testing/LinHES-config/PKGBUILD
index 1e2ede9..aac97cc 100755
--- a/abs/core-testing/LinHES-config/PKGBUILD
+++ b/abs/core-testing/LinHES-config/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=LinHES-config
 pkgver=1.0
-pkgrel=153
+pkgrel=154
 conflicts=(MythVantage-config MythVantage-config-dev LinHES-config-dev )
 pkgdesc="Install and configure your system"
 depends=(bc libstatgrab  mysql-python expect curl dnsutils parted sg3_utils nmbscan )
-- 
cgit v0.12

