From a3ad759091d9d59ba9663394b685f2d676f9d1c5 Mon Sep 17 00:00:00 2001
From: Cecil Hugh Watson <knoppmyth@gmail.com>
Date: Sun, 28 Jun 2009 20:23:13 -0700
Subject: Redirects to the right port for fuppes.

---
 abs/core-testing/local-website/PKGBUILD          | 2 +-
 abs/core-testing/local-website/htdocs/fuppes.php | 2 +-
 2 files changed, 2 insertions(+), 2 deletions(-)

diff --git a/abs/core-testing/local-website/PKGBUILD b/abs/core-testing/local-website/PKGBUILD
index 6ce813c..a47c062 100644
--- a/abs/core-testing/local-website/PKGBUILD
+++ b/abs/core-testing/local-website/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=local-website
 pkgver=2
-pkgrel=7
+pkgrel=8
 pkgdesc="Contents of http://localhost"
 arch=(i686 x86_64)
 license=('GPL')
diff --git a/abs/core-testing/local-website/htdocs/fuppes.php b/abs/core-testing/local-website/htdocs/fuppes.php
index f082f31..44129d2 100644
--- a/abs/core-testing/local-website/htdocs/fuppes.php
+++ b/abs/core-testing/local-website/htdocs/fuppes.php
@@ -1,4 +1,4 @@
 <?php
 $HTTP_HOST = getenv('HTTP_HOST');
-header("Location: http://$HTTP_HOST:81/");
+header("Location: http://$HTTP_HOST:8100/");
 ?>
-- 
cgit v0.12

