From c802f4e68f36af6d4ff89fc33c50a1837e007b76 Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Mon, 9 Mar 2009 11:44:23 -0500
Subject: runit  don't symlink if it's already present.

---
 abs/core-testing/runit/PKGBUILD      |  2 +-
 abs/core-testing/runit/runit.install | 23 +++++++----------------
 2 files changed, 8 insertions(+), 17 deletions(-)

diff --git a/abs/core-testing/runit/PKGBUILD b/abs/core-testing/runit/PKGBUILD
index 1303167..90bb57e2 100755
--- a/abs/core-testing/runit/PKGBUILD
+++ b/abs/core-testing/runit/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=runit
 pkgver=1.8.0
-pkgrel=61
+pkgrel=62
 pkgdesc="A replacement for sysvinit, and other init schemes, with service supervision"
 url="http://smarden.org/runit/"
 license="BSD"
diff --git a/abs/core-testing/runit/runit.install b/abs/core-testing/runit/runit.install
index b6fcb07..1728bc6 100755
--- a/abs/core-testing/runit/runit.install
+++ b/abs/core-testing/runit/runit.install
@@ -27,29 +27,20 @@ fi
 }
 
 post_install () {
- 
   mkdir /var/service
-  ln -s /sbin/halt.script /sbin/halt
-  ln -s /sbin/reboot.script /sbin/reboot
-  ln -s /sbin/poweroff.script /sbin/poweroff
-  ln -s /sbin/halt-init /sbin/reboot.init
-  ln -s /sbin/halt-init /sbin/poweroff.init
-  ln -s /sbin/shutdown.script /sbin/shutdown
-
-
+   [ -e /sbin/halt ] || ln -s /sbin/halt.script /sbin/halt
+   [ -e /sbin/reboot ] || ln -s /sbin/reboot.script /sbin/reboot
+   [ -e /sbin/poweroff ] ||  ln -s /sbin/poweroff.script /sbin/poweroff
+   [ -e /sbin/reboot.init ] || ln -s /sbin/halt-init /sbin/reboot.init
+   [ -e /sbin/poweroff.init ] || ln -s /sbin/halt-init /sbin/poweroff.init
+   [ -e /sbin/shutdown ] || ln -s /sbin/shutdown.script /sbin/shutdown
 }
 
 # arg 1:  the new package version
 # arg 2:  the old package version
 
 post_upgrade(){
-  ln -s /sbin/halt.script /sbin/halt
-  ln -s /sbin/reboot.script /sbin/reboot
-  ln -s /sbin/poweroff.script /sbin/poweroff
-  ln -s /sbin/halt-init /sbin/reboot.init
-  ln -s /sbin/halt-init /sbin/poweroff.init
-  ln -s /sbin/shutdown.script /sbin/shutdown
-
+    /bin/true
 }
 
 op=$1
-- 
cgit v0.12

