From d7d468a521949ab4dd392bb64d34cf0ea97eada6 Mon Sep 17 00:00:00 2001
From: Bob Igo <bob@stormlogic.com>
Date: Thu, 16 Jul 2009 13:48:54 -0400
Subject: '-vo null' was causing some codecs to be mis-identified

---
 abs/core-testing/mplayer-wrapper/PKGBUILD           | 2 +-
 abs/core-testing/mplayer-wrapper/mplayer-wrapper.pl | 2 +-
 2 files changed, 2 insertions(+), 2 deletions(-)

diff --git a/abs/core-testing/mplayer-wrapper/PKGBUILD b/abs/core-testing/mplayer-wrapper/PKGBUILD
index 2f33bbc..9c0934b 100644
--- a/abs/core-testing/mplayer-wrapper/PKGBUILD
+++ b/abs/core-testing/mplayer-wrapper/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=mplayer-wrapper
 pkgver=1	
-pkgrel=4
+pkgrel=5
 pkgdesc="wrapper for mplayer and mplayer derivatives"
 arch=('i686' 'x86_64')
 
diff --git a/abs/core-testing/mplayer-wrapper/mplayer-wrapper.pl b/abs/core-testing/mplayer-wrapper/mplayer-wrapper.pl
index a664a99..86c40c6 100755
--- a/abs/core-testing/mplayer-wrapper/mplayer-wrapper.pl
+++ b/abs/core-testing/mplayer-wrapper/mplayer-wrapper.pl
@@ -99,7 +99,7 @@ sub dynamic_parameters () {
     my $codec="";
 
     # figure out what codec the video uses
-    my $command="mplayer -identify -vo null -frames 0 \"$mediafile\" | grep ID_VIDEO_CODEC | cut -c 16- |";
+    my $command="mplayer -identify -frames 0 \"$mediafile\" | grep ID_VIDEO_CODEC | cut -c 16- |";
     open(SHELL, $command);
     while (<SHELL>) {
 	chop;
-- 
cgit v0.12

