From 1790a798f524c12a47dff76d200124b607be1c5e Mon Sep 17 00:00:00 2001
From: Greg Frost <gregfrost1@bigpond.com>
Date: Sat, 18 Jul 2009 10:41:38 +0930
Subject: runit-scripts: add wall for reboot and halt

---
 abs/core-testing/runit-scripts/PKGBUILD                  | 4 ++--
 abs/core-testing/runit-scripts/runitscripts/halt-runit   | 1 +
 abs/core-testing/runit-scripts/runitscripts/reboot-runit | 1 +
 3 files changed, 4 insertions(+), 2 deletions(-)

diff --git a/abs/core-testing/runit-scripts/PKGBUILD b/abs/core-testing/runit-scripts/PKGBUILD
index 2c237d7..7fe22bf 100755
--- a/abs/core-testing/runit-scripts/PKGBUILD
+++ b/abs/core-testing/runit-scripts/PKGBUILD
@@ -1,11 +1,11 @@
 pkgname=runit-scripts
 pkgver=1.8.0
-pkgrel=90
+pkgrel=91
 pkgdesc="collection of startup scripts for runit"
 url="http://smarden.org/runit/"
 license="BSD"
 depends=('glibc' 'util-linux' 'initscripts' 'runit' )
-makedepends=()
+makedepends=('rsync')
 conflicts=()
 replaces=()
 backup=(etc/runit/1.local)
diff --git a/abs/core-testing/runit-scripts/runitscripts/halt-runit b/abs/core-testing/runit-scripts/runitscripts/halt-runit
index 7c07b05..b7d9a95 100755
--- a/abs/core-testing/runit-scripts/runitscripts/halt-runit
+++ b/abs/core-testing/runit-scripts/runitscripts/halt-runit
@@ -1,2 +1,3 @@
 #!/bin/sh
+wall "System will shutdown NOW"
 runit-init 0
diff --git a/abs/core-testing/runit-scripts/runitscripts/reboot-runit b/abs/core-testing/runit-scripts/runitscripts/reboot-runit
index be831ec..0d3d9d4 100755
--- a/abs/core-testing/runit-scripts/runitscripts/reboot-runit
+++ b/abs/core-testing/runit-scripts/runitscripts/reboot-runit
@@ -1,2 +1,3 @@
 #!/bin/sh
+wall "System will reboot NOW"
 runit-init 6
-- 
cgit v0.12

