From 240fef715c025abf872f7f3e8b9a99e0d987953d Mon Sep 17 00:00:00 2001
From: Cecil Hugh Watson <knoppmyth@gmail.com>
Date: Fri, 27 Feb 2009 15:46:11 -0800
Subject: Let's not load lirc_mceusb2.

---
 abs/core-testing/lirc/PKGBUILD | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

diff --git a/abs/core-testing/lirc/PKGBUILD b/abs/core-testing/lirc/PKGBUILD
index f6fff65..eb62b7d 100644
--- a/abs/core-testing/lirc/PKGBUILD
+++ b/abs/core-testing/lirc/PKGBUILD
@@ -3,7 +3,7 @@
 
 pkgname=lirc
 pkgver=0.8.5CVS
-pkgrel=2
+pkgrel=3
 _kernver=2.6.28-LinHES
 pkgdesc="Linux Infrared Remote Control kernel modules for stock arch kernel"
 arch=(i686 x86_64)
@@ -57,6 +57,7 @@ build() {
 	patch -p1 < ../lirc_mod_mce.patch
 	make KDIR=/usr/src/linux-2.6.28-LinHES/
 	cp lirc_mod_mce.ko $startdir/pkg/lib/modules/2.6.28-LinHES/kernel/drivers/misc/
+	mv $startdir/pkg/lib/modules/2.6.28-LinHES/kernel/drivers/misc/lirc_mceusb2.ko $startdir/pkg/lib/modules/2.6.28-LinHES/kernel/drivers/misc/lirc_mceusb2.ko.not
 }
 md5sums=('8f3ba7eb57529992f3991d6981a3feb6'
          '1753acd774f50b638e6173d364de53fd'
-- 
cgit v0.12

