From 27971630e959debb00d3013267f1e32321604d7e Mon Sep 17 00:00:00 2001
From: Cecil Hugh Watson <knoppmyth@gmail.com>
Date: Fri, 20 Feb 2009 02:52:17 -0800
Subject: Fixed typo.

---
 abs/core-testing/LinHES-config/PKGBUILD | 2 +-
 abs/core-testing/LinHES-config/README   | 2 +-
 2 files changed, 2 insertions(+), 2 deletions(-)

diff --git a/abs/core-testing/LinHES-config/PKGBUILD b/abs/core-testing/LinHES-config/PKGBUILD
index 30c5d9a..e1acc26 100755
--- a/abs/core-testing/LinHES-config/PKGBUILD
+++ b/abs/core-testing/LinHES-config/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=LinHES-config
 pkgver=1.0
-pkgrel=282
+pkgrel=283
 conflicts=(MythVantage-config MythVantage-config-dev LinHES-config-dev )
 pkgdesc="Install and configure your system"
 depends=(bc libstatgrab  mysql-python expect curl dnsutils parted sg3_utils nmbscan )
diff --git a/abs/core-testing/LinHES-config/README b/abs/core-testing/LinHES-config/README
index 56d53b0..a615389 100644
--- a/abs/core-testing/LinHES-config/README
+++ b/abs/core-testing/LinHES-config/README
@@ -1,6 +1,6 @@
 Thanks for giving this Preview Release of LinHES a try!  
 While the core of LinHes is quite stable, we still need to 
-implement some features. At the moment, LinHES is compiled for i686.  If you have an i586 class system, LinHES won't work for you.  We do intend for LinHES to be full i586 compatible.  In addition, we still have to implement support for more remotes and blasters. The TV out of the PVR-350 isn't supported a t this time.  
+implement some features. At the moment, LinHES is compiled for i686.  If you have an i586 class system, LinHES won't work for you.  We do intend for LinHES to be full i586 compatible.  In addition, we still have to implement support for more remotes and blasters. The TV out of the PVR-350 isn't supported at this time.  
 
 Support for LinHES can be obtained at:
 http://linhes.org
-- 
cgit v0.12

