From 28a185bb865ada95e238768714b32ff2df92ba91 Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Sat, 11 Apr 2009 16:56:35 -0500
Subject: linhes-scripts: rebuild to catch vdpaudetector

---
 abs/core-testing/linhes-scripts/PKGBUILD | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

diff --git a/abs/core-testing/linhes-scripts/PKGBUILD b/abs/core-testing/linhes-scripts/PKGBUILD
index 612a513..42f5a54 100644
--- a/abs/core-testing/linhes-scripts/PKGBUILD
+++ b/abs/core-testing/linhes-scripts/PKGBUILD
@@ -3,7 +3,7 @@
 
 pkgname=linhes-scripts
 pkgver=1
-pkgrel=8
+pkgrel=9
 pkgdesc="Various scripts that help to make LinHES, LinHES."
 arch=('i686' 'x86_64')
 license=('GPL2')
-- 
cgit v0.12

