From 5052e9c0a398e308a876eba561d5499d810df0ae Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Thu, 26 Feb 2009 16:08:19 -0600
Subject: added --driver=dvico for dvico remote. Should work, but untested

---
 abs/core-testing/runit-scripts/PKGBUILD                        | 2 +-
 abs/core-testing/runit-scripts/runitscripts/services/lircd/run | 3 ++-
 2 files changed, 3 insertions(+), 2 deletions(-)

diff --git a/abs/core-testing/runit-scripts/PKGBUILD b/abs/core-testing/runit-scripts/PKGBUILD
index 3811e1a..63f061e 100755
--- a/abs/core-testing/runit-scripts/PKGBUILD
+++ b/abs/core-testing/runit-scripts/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=runit-scripts
 pkgver=1.8.0
-pkgrel=32
+pkgrel=33
 pkgdesc="collection of startup scripts for runit"
 url="http://smarden.org/runit/"
 license="BSD"
diff --git a/abs/core-testing/runit-scripts/runitscripts/services/lircd/run b/abs/core-testing/runit-scripts/runitscripts/services/lircd/run
index ceda8db..46b850d 100755
--- a/abs/core-testing/runit-scripts/runitscripts/services/lircd/run
+++ b/abs/core-testing/runit-scripts/runitscripts/services/lircd/run
@@ -9,7 +9,8 @@ function dvico_detect {
 
   if [ x$Remotetype = "xdvico" ]
   then
-                DEVICE="/dev/usb/hiddev0"
+        #assume if using dvico remote then dvico receiver is used.
+                DEVICE="/dev/usb/hiddev0 --driver=dvico"
   fi
 }
 
-- 
cgit v0.12

