From 79ddaba300b4887c9610732c1e2aac7361cbcee5 Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Thu, 4 Dec 2008 15:30:00 -0600
Subject: remove some debugging statements

---
 abs/core-testing/sysvinit/PKGBUILD        | 2 +-
 abs/core-testing/sysvinit/halt-init.patch | 4 ++--
 2 files changed, 3 insertions(+), 3 deletions(-)

diff --git a/abs/core-testing/sysvinit/PKGBUILD b/abs/core-testing/sysvinit/PKGBUILD
index 2a32da9..6fbb3cd 100644
--- a/abs/core-testing/sysvinit/PKGBUILD
+++ b/abs/core-testing/sysvinit/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=sysvinit
 pkgver=2.86
-pkgrel=11
+pkgrel=12
 pkgdesc="Linux System V Init"
 arch=(i686 x86_64)
 license=('GPL')
diff --git a/abs/core-testing/sysvinit/halt-init.patch b/abs/core-testing/sysvinit/halt-init.patch
index 3c61e0f..88eb0ce 100644
--- a/abs/core-testing/sysvinit/halt-init.patch
+++ b/abs/core-testing/sysvinit/halt-init.patch
@@ -7,8 +7,8 @@
 +	if (!strcmp(progname, "reboot.init")) do_reboot = 1;
 +	if (!strcmp(progname, "poweroff.init")) do_poweroff = 1;
 +
-+	fprintf(stderr, "%d: do_reboot \n ", do_reboot);
-+	fprintf(stderr, "%d: do_poweroff \n ", do_poweroff);
++	//fprintf(stderr, "%d: do_reboot \n ", do_reboot);
++	//fprintf(stderr, "%d: do_poweroff \n ", do_poweroff);
 +	//fprintf(stderr, "%s: \n", progname);
 +	//do_nothing = 1;
 +
-- 
cgit v0.12

