From 8868210a41ed26b7406318e6a3d3574663e02c81 Mon Sep 17 00:00:00 2001
From: Cecil Hugh Watson <knoppmyth@gmail.com>
Date: Sun, 9 Aug 2009 22:09:16 -0700
Subject: Myt2xvid3:modified to created feed.php after installing so 404 isn't
 displayed.

---
 abs/extra-testing/myt2xvid3/PKGBUILD          | 2 +-
 abs/extra-testing/myt2xvid3/myt2xvid3.install | 1 +
 2 files changed, 2 insertions(+), 1 deletion(-)

diff --git a/abs/extra-testing/myt2xvid3/PKGBUILD b/abs/extra-testing/myt2xvid3/PKGBUILD
index e5b3af9..f7d6db3 100755
--- a/abs/extra-testing/myt2xvid3/PKGBUILD
+++ b/abs/extra-testing/myt2xvid3/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=myt2xvid3
 pkgver=0.1
-pkgrel=5
+pkgrel=6
 arch=("i686")
 pkgdesc="A multimedia framework based on the MPEG-4 Systems standard"
 url="http://www.knoppmythwiki.org/index.php?page=XvidEncoding"
diff --git a/abs/extra-testing/myt2xvid3/myt2xvid3.install b/abs/extra-testing/myt2xvid3/myt2xvid3.install
index 8afb390..a27a885 100755
--- a/abs/extra-testing/myt2xvid3/myt2xvid3.install
+++ b/abs/extra-testing/myt2xvid3/myt2xvid3.install
@@ -19,6 +19,7 @@ post_install() {
 	mv /usr/bin/myt2xvid3 /tmp
 	sed -e "s/REPLACEME/$HOSTNAME/g" /tmp/myt2xvid3 > /usr/bin/myt2xvid3
 	chown -R mythtv:http /myth/video/archive
+	/usr/bin/myt2xvid3 -rebuild
 }
 
 post_upgrade() {
-- 
cgit v0.12

