From 8cf4c240d609d3fe1ac5332c25217f636351e31a Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Sun, 21 Mar 2010 17:25:20 -0500
Subject: linhes-system: set defaults for unclutter back to sane values for an
 appliance, for when the cfg file can not be found. modify system to make use
 of /etc/unclutter.cfg If the enduser doesn't like the default values they can
 safely make changes to /etc/unclutter.cfg

closes 660
ref 628
---
 abs/core-testing/LinHES-system/LinHES-run          |  6 ++++--
 abs/core-testing/LinHES-system/PKGBUILD            | 15 ++++++++++++++-
 abs/core-testing/LinHES-system/unclutter-toggle.sh |  5 ++++-
 3 files changed, 22 insertions(+), 4 deletions(-)

diff --git a/abs/core-testing/LinHES-system/LinHES-run b/abs/core-testing/LinHES-system/LinHES-run
index 2322b3b..8f235e8 100644
--- a/abs/core-testing/LinHES-system/LinHES-run
+++ b/abs/core-testing/LinHES-system/LinHES-run
@@ -1,13 +1,15 @@
 #!/bin/sh
 . /etc/profile
 . /etc/systemconfig
-
+idle=1
+jitter=200
+. /etc/unclutter.cfg
 #keylaunch &
 #/usr/bin/tilda &
 
 #move mouse to corner
 xdotool mousemove -10 -10
-/usr/X11R6/bin/unclutter -root -idle 5 -jitter 5 -noevents  &
+/usr/X11R6/bin/unclutter -root -idle $idle -jitter $jitter -noevents  &
 if [ x"$Screensavertype" = "xgscreensaver" ]
 then
     gnome-screensaver &
diff --git a/abs/core-testing/LinHES-system/PKGBUILD b/abs/core-testing/LinHES-system/PKGBUILD
index 5616746..f775314 100644
--- a/abs/core-testing/LinHES-system/PKGBUILD
+++ b/abs/core-testing/LinHES-system/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=LinHES-system
 pkgver=1.1
-pkgrel=9
+pkgrel=11
 arch=('i686')
 MVDIR=$startdir/pkg/usr/LH
 BINDIR=$startdir/pkg/usr/bin
@@ -81,3 +81,16 @@ md5sums=('19934a456d0e112298b8aac3279f9a16'
          'f1870a9522c79e6b248fcbf81dec3280'
          'abe887472a170bd1a8e6da6a7b7e93e4'
          'eb879fee9603a05d5420d4ce8ed9e450')
+md5sums=('19934a456d0e112298b8aac3279f9a16'
+         '5881bdb43d578ec3a79d1f77ea58a3db'
+         'a875ee97f86e46f34a741c2bc455f894'
+         'cdcbc530224215f8fcf7ebcd93d7eb0b'
+         'c60b6c66f498809a6e5ca18a8c97d336'
+         'ccae1296ef248fa52ec3a7cb820a476e'
+         '6022095f05d0428de926bb81b1693d56'
+         '18a884a73344ff6eb74f63b49745e0f5'
+         'dc3eef2a624754e16805d72bbe488b67'
+         'dc0be354ce77ba2b89868fc29b942c43'
+         'f1870a9522c79e6b248fcbf81dec3280'
+         'abe887472a170bd1a8e6da6a7b7e93e4'
+         'eb879fee9603a05d5420d4ce8ed9e450')
diff --git a/abs/core-testing/LinHES-system/unclutter-toggle.sh b/abs/core-testing/LinHES-system/unclutter-toggle.sh
index 0ead751..aadce50 100644
--- a/abs/core-testing/LinHES-system/unclutter-toggle.sh
+++ b/abs/core-testing/LinHES-system/unclutter-toggle.sh
@@ -1,8 +1,11 @@
 #!/bin/bash
 PIDUNC=`pidof unclutter`
+jitter=200
+idle=1
+. /etc/unclutter.cfg
 if [ -n "${PIDUNC}" ];
 then
     killall -9 unclutter
 else
-    /usr/X11R6/bin/unclutter -root -idle 1 -jitter 200 -noevents &
+    /usr/X11R6/bin/unclutter -root -idle $idle -jitter $jitter -noevents &
 fi
-- 
cgit v0.12

