From a22d235cd404f34ea89928c3bbda656a59e270e0 Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Tue, 8 Sep 2009 17:11:01 -0500
Subject: initscripts:  ALWAYS run netfs on shutdown

---
 abs/core-testing/initscripts/PKGBUILD          | 2 +-
 abs/core-testing/initscripts/rc.shutdown.patch | 6 +++---
 2 files changed, 4 insertions(+), 4 deletions(-)

diff --git a/abs/core-testing/initscripts/PKGBUILD b/abs/core-testing/initscripts/PKGBUILD
index c568c38..7f886e0 100644
--- a/abs/core-testing/initscripts/PKGBUILD
+++ b/abs/core-testing/initscripts/PKGBUILD
@@ -4,7 +4,7 @@
 
 pkgname=initscripts
 pkgver=2009.01
-pkgrel=7
+pkgrel=9
 pkgdesc="System initialization/bootup scripts"
 arch=('i686' 'x86_64')
 url="http://www.archlinux.org"
diff --git a/abs/core-testing/initscripts/rc.shutdown.patch b/abs/core-testing/initscripts/rc.shutdown.patch
index 187d1b7..7456b54 100644
--- a/abs/core-testing/initscripts/rc.shutdown.patch
+++ b/abs/core-testing/initscripts/rc.shutdown.patch
@@ -5,10 +5,10 @@
  fi
  
 +#unmount network filesystems for runit
-+if [ -e /var/service/netfs ]
-+then
++#if [ -e /var/service/netfs ]
++#then
 +    /etc/rc.d/netfs stop
-+fi
++#fi
 +
  if [ "$PREVLEVEL" = "3" -o "$PREVLEVEL" = "5" ]; then
  	# Shutdown daemons
-- 
cgit v0.12

