From ac3eb72b60881ff3478663ec4aaf60b708edd870 Mon Sep 17 00:00:00 2001
From: Nathan Harris <nharris@eoimaging.com>
Date: Thu, 19 Feb 2009 10:51:28 -0500
Subject: added firewire support

---
 abs/core-testing/mythtv/trunk/mythtv/PKGBUILD | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

diff --git a/abs/core-testing/mythtv/trunk/mythtv/PKGBUILD b/abs/core-testing/mythtv/trunk/mythtv/PKGBUILD
index 4c03923..7299836 100755
--- a/abs/core-testing/mythtv/trunk/mythtv/PKGBUILD
+++ b/abs/core-testing/mythtv/trunk/mythtv/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=mythtv-svn
 pkgver=20018
-pkgrel=1
+pkgrel=2
 pkgdesc="A personal video recorder for Linux"
 url="http://www.mythtv.org"
 license="GPL"
@@ -15,7 +15,7 @@ groups=('pvr')
 #MAKEFLAGS="-j6"
 install='mythtv.install'
 
-patchs=('smolt_jump.patch' 'DeviceReadBuffer-polltimeout.2.patch' 'hdpvr_audio_codec_selection-v1.1.diff')
+patchs=('smolt_jump.patch' 'hdpvr_audio_codec_selection-v1.1.diff')
 #patchs=('svn_main_menu_popup.patch' 'smolt_jump.patch' 'DeviceReadBuffer-polltimeout.2.patch' 'hdpvr_audio_codec_selection-v1.1.diff')
 source=('mythbackend' 'myth.sh' `echo ${patchs[@]:0}` )
 arch=('i686' 'x86_64')
@@ -48,7 +48,7 @@ build() {
 	# configure
 	./configure --prefix=/usr --cpu=${ARCH} \
 	--enable-vdpau --enable-xvmc --enable-xvmc-pro \
-	--enable-opengl-vsync --enable-libfaad --enable-dvb --disable-firewire \
+	--enable-opengl-vsync --enable-libfaad --enable-dvb --enable-firewire \
 	--compile-type=release --with-bindings=perl,python \
 	--enable-audio-alsa --disable-audio-jack --disable-audio-arts || return 1
 
-- 
cgit v0.12

