From bc89e28ec975fd91addbad23899344444ff5d631 Mon Sep 17 00:00:00 2001
From: Cecil Hugh Watson <knoppmyth@gmail.com>
Date: Sat, 13 Jun 2009 10:16:16 -0700
Subject: Reverted changed.

---
 abs/core-testing/runit-scripts/PKGBUILD                             | 2 +-
 .../runit-scripts/runitscripts/services/mythbackend/run             | 6 ------
 2 files changed, 1 insertion(+), 7 deletions(-)

diff --git a/abs/core-testing/runit-scripts/PKGBUILD b/abs/core-testing/runit-scripts/PKGBUILD
index 3872d3d..efe7947 100755
--- a/abs/core-testing/runit-scripts/PKGBUILD
+++ b/abs/core-testing/runit-scripts/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=runit-scripts
 pkgver=1.8.0
-pkgrel=86
+pkgrel=87
 pkgdesc="collection of startup scripts for runit"
 url="http://smarden.org/runit/"
 license="BSD"
diff --git a/abs/core-testing/runit-scripts/runitscripts/services/mythbackend/run b/abs/core-testing/runit-scripts/runitscripts/services/mythbackend/run
index 0082c88..48c68d3 100755
--- a/abs/core-testing/runit-scripts/runitscripts/services/mythbackend/run
+++ b/abs/core-testing/runit-scripts/runitscripts/services/mythbackend/run
@@ -27,11 +27,5 @@ mkfifo /tmp/mbefifo >/dev/null 2>/dev/null
 # 			sleep 10
 #
 # 		else
-if [ -e /dev/raw1394 ]
-then
-	exec su mythtv -c "/usr/bin/plugctl -n 0 "oPCR[0].n_p2p_connections=1""
-else
-	echo "No firewire detected"
-fi
 			exec su mythtv -c "/usr/bin/mythbackend --logfile /var/log/mythtv/mythbackend.log"
 # 		fi
-- 
cgit v0.12

