From 66fdf963671a968eee41114e36b198a997488d2b Mon Sep 17 00:00:00 2001
From: Cecil Hugh Watson <knoppmyth@gmail.com>
Date: Wed, 25 Feb 2009 18:16:57 -0800
Subject: Clean up.

---
 abs/core-testing/lirc-utils/PKGBUILD | 5 +++--
 1 file changed, 3 insertions(+), 2 deletions(-)

diff --git a/abs/core-testing/lirc-utils/PKGBUILD b/abs/core-testing/lirc-utils/PKGBUILD
index 252e48d..e35db01 100644
--- a/abs/core-testing/lirc-utils/PKGBUILD
+++ b/abs/core-testing/lirc-utils/PKGBUILD
@@ -3,7 +3,7 @@
 
 pkgname=lirc-utils
 pkgver=0.8.5CVS
-pkgrel=1
+pkgrel=2
 pkgdesc="Linux Infrared Remote Control utils"
 arch=(i686 x86_64)
 url="http://www.lirc.org/"
@@ -16,7 +16,8 @@ backup=('etc/lircd.conf' 'etc/lircmd.conf'\
         'etc/conf.d/lircd')
 options=('!libtool' '!makeflags')
 source=(http://www.blushingpenguin.com/mark/lmilk/lirc-0.8.5-CVS-pvr150.tar.bz2 \
-	lircd lircmd lirc.logrotate lircd.conf.d kernel-2.6.26.patch lirc_atiusb.patch)
+	lircd lircmd lirc.logrotate lircd.conf.d \
+	kernel-2.6.26.patch lirc_atiusb.patch) 
 md5sums=('b96dae91b566143b3af433fa2714ec9a' '909ad968afa10e4511e1da277bb23c3b'\
          '85f7fdac55e5256967241864049bf5e9' '3deb02604b37811d41816e9b4385fcc3'\
          '5b1f8c9cd788a39a6283f93302ce5c6e' '1753acd774f50b638e6173d364de53fd'\
-- 
cgit v0.12

