From 4cb1ab858b9ad93a2bc16b3e9966dee4c2043ddd Mon Sep 17 00:00:00 2001
From: Greg Frost <gregfrost1@bigpond.com>
Date: Sun, 19 Jul 2009 15:43:04 +0930
Subject: system-templates: autodetection of Dvico DD4-rev2

---
 abs/core-testing/system-templates/PKGBUILD                          | 2 +-
 abs/core-testing/system-templates/templates/remotes/receiver_usb.id | 2 ++
 2 files changed, 3 insertions(+), 1 deletion(-)

diff --git a/abs/core-testing/system-templates/PKGBUILD b/abs/core-testing/system-templates/PKGBUILD
index ed6856f..904db3c 100755
--- a/abs/core-testing/system-templates/PKGBUILD
+++ b/abs/core-testing/system-templates/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=system-templates
 pkgver=1.0
-pkgrel=28
+pkgrel=29
 conflicts=( )
 pkgdesc="Templates used for system configuration"
 depends=()
diff --git a/abs/core-testing/system-templates/templates/remotes/receiver_usb.id b/abs/core-testing/system-templates/templates/remotes/receiver_usb.id
index 71b37d1..f76442a 100644
--- a/abs/core-testing/system-templates/templates/remotes/receiver_usb.id
+++ b/abs/core-testing/system-templates/templates/remotes/receiver_usb.id
@@ -4,6 +4,7 @@
 0bc7:0004|ATI_Remote_Wonder|    " ATI Remote Wonder"
 0e9c:0000|streamzap|    "Streamzap Remote"
 0fe9:9010|dvico|   "DVICO Remote:"
+0fe9:db98|Dvico-Dual-Digital4-rev2| "Dvico Dual Digital4 rev2 0fe9/db98"
 6253:0100|Twinhan_USB|  "the VisionPlus is a Twinhan clone "
 1509:9242|mceusb|  "FIC eHome Infrared Transceiver 1509/9242"
 1934:0602|mceusb|  "Fintek eHome Infrared Transceiver 1934/0602"
@@ -31,3 +32,4 @@
 1784:0007|mceusb|  "Topseed HP eHome Infrared Transceiver 1784/0007"
 1784:0008|mceusb|  "Topseed eHome Infrared Transceiver 1784/0008"
 045e:006d|mceusb-old|  "USB Microsoft IR Transceiver Driver 045e/006d"
+
-- 
cgit v0.12

