From 50d5f62e8ae3429f800ecfa8d50fc2333c13b2d7 Mon Sep 17 00:00:00 2001
From: Bob Igo <bob@stormlogic.com>
Date: Thu, 6 Aug 2009 14:35:31 -0400
Subject: using better theme options for Dragon hardware

---
 abs/core-testing/tweaker/PKGBUILD          | 2 +-
 abs/core-testing/tweaker/bin/twk_dragon.pl | 2 +-
 2 files changed, 2 insertions(+), 2 deletions(-)

diff --git a/abs/core-testing/tweaker/PKGBUILD b/abs/core-testing/tweaker/PKGBUILD
index 0ea973e..453240c 100644
--- a/abs/core-testing/tweaker/PKGBUILD
+++ b/abs/core-testing/tweaker/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=tweaker
 pkgver=1
-pkgrel=51
+pkgrel=52
 pkgdesc="applies tweaks to the baseline configuration and attempts to optimize settings for the hardware it finds"
 arch=('i686' 'x86_64')
 
diff --git a/abs/core-testing/tweaker/bin/twk_dragon.pl b/abs/core-testing/tweaker/bin/twk_dragon.pl
index 1234f90..21a9dc7 100755
--- a/abs/core-testing/tweaker/bin/twk_dragon.pl
+++ b/abs/core-testing/tweaker/bin/twk_dragon.pl
@@ -36,7 +36,7 @@ sub implement_option {
 	do_query("UPDATE cardinput SET sourceid='10' WHERE sourceid='20'") || return -1;
 
 	# Use the most beautiful theme
-	change_or_make_setting('Theme', 'blootubelite-wide') || exit -1;
+	change_or_make_setting('Theme', 'blootube-wide') || exit -1;
     } else {
 	my $logger = get_logger('tweaker.script');
 	$logger->error("ERROR: Unable to connect to mythconverg database");
-- 
cgit v0.12

