From 5fa0aec4485b8adea46ef434d8c5384482b44c65 Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Sun, 14 Mar 2010 22:17:02 -0500
Subject: lighttpd: fix minor mistake in the sed regex added missing ^

---
 abs/core-testing/lighttpd/PKGBUILD         | 2 +-
 abs/core-testing/lighttpd/lighttpd.install | 2 +-
 2 files changed, 2 insertions(+), 2 deletions(-)

diff --git a/abs/core-testing/lighttpd/PKGBUILD b/abs/core-testing/lighttpd/PKGBUILD
index cec41d4..c31e924 100644
--- a/abs/core-testing/lighttpd/PKGBUILD
+++ b/abs/core-testing/lighttpd/PKGBUILD
@@ -3,7 +3,7 @@
 
 pkgname=lighttpd
 pkgver=1.4.26
-pkgrel=7
+pkgrel=8
 pkgdesc='a secure, fast, compliant and very flexible web-server'
 license=('custom')
 arch=('i686' 'x86_64')
diff --git a/abs/core-testing/lighttpd/lighttpd.install b/abs/core-testing/lighttpd/lighttpd.install
index 0e32a66..a921b0f 100755
--- a/abs/core-testing/lighttpd/lighttpd.install
+++ b/abs/core-testing/lighttpd/lighttpd.install
@@ -2,6 +2,6 @@ pre_upgrade() {
     mv /etc/lighttpd/lighttpd.conf  /etc/lighttpd/lighttpd.conf.old
 }
 post_upgrade() {
-    sed -i 's|"^/mythweb|"/{1,2}mythweb|g' /etc/lighttpd/lighttpd.conf
+    sed -i 's|"^/mythweb|"^/{1,2}mythweb|g' /etc/lighttpd/lighttpd.conf
     touch /etc/lighttpd/lighttpd.user
 }
-- 
cgit v0.12

