From 66f87e380321a1d151cf2ab692fa99868bdcc87c Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Tue, 11 Nov 2008 16:10:11 -0600
Subject: remove my copy of mysql

---
 abs/mv-core/mysql/PKGBUILD               |  48 ----------
 abs/mv-core/mysql/my.cnf                 | 150 -------------------------------
 abs/mv-core/mysql/my.cnf.mv              | 150 -------------------------------
 abs/mv-core/mysql/mysql-no-clients.patch |  65 --------------
 abs/mv-core/mysql/mysqld                 |  87 ------------------
 abs/mv-core/mysql/mysqld.conf.d          |   1 -
 6 files changed, 501 deletions(-)
 delete mode 100644 abs/mv-core/mysql/PKGBUILD
 delete mode 100644 abs/mv-core/mysql/my.cnf
 delete mode 100644 abs/mv-core/mysql/my.cnf.mv
 delete mode 100644 abs/mv-core/mysql/mysql-no-clients.patch
 delete mode 100755 abs/mv-core/mysql/mysqld
 delete mode 100644 abs/mv-core/mysql/mysqld.conf.d

diff --git a/abs/mv-core/mysql/PKGBUILD b/abs/mv-core/mysql/PKGBUILD
deleted file mode 100644
index eac4347..0000000
--- a/abs/mv-core/mysql/PKGBUILD
+++ /dev/null
@@ -1,48 +0,0 @@
-pkgname=mysql
-pkgver=5.0.60
-pkgrel=1001
-pkgdesc="A fast SQL database server"
-arch=(i686 x86_64)
-backup=(etc/my.cnf etc/conf.d/mysqld)
-depends=("mysql-clients>=${pkgver}" 'tcp_wrappers')
-makedepends=('libtool')
-url=('http://www.mysql.com/')
-options=('!libtool')
-license=('GPL')
-source=(http://mirror.provenscaling.com/mysql/enterprise/source/5.0/mysql-${pkgver}.tar.gz
-	mysql-no-clients.patch
-	mysqld
-	my.cnf
-	mysqld.conf.d)
-
-build() {
-  # PIC
-  cd ${startdir}/src/${pkgname}-${pkgver}
-  patch -Np1 -i ${startdir}/src/mysql-no-clients.patch || return 1
-  ./configure --prefix=/usr --libexecdir=/usr/sbin \
-    --without-debug --without-docs --without-bench --without-readline \
-    --with-innodb --enable-local-infile --with-openssl \
-    --with-charset=latin1 --with-collation=latin1_general_ci \
-    --with-extra-charsets=complex --enable-thread-safe-client \
-    --with-libwrap --with-berkeley-db
-
-  # fixes
-  sed -i -e 's/^.*HAVE_GETHOSTBYNAME_R_GLIBC2_STYLE.*$/#define\ HAVE_GETHOSTBYNAME_R_GLIBC2_STYLE/g' include/config.h || return 1
-  sed -i -e 's/size_socket/socklen_t/g' sql/mysqld.cc || return 1
-
-  pushd include || return
-  make || return 1
-  popd
-  pushd libmysql
-  make link_sources get_password.lo || return
-  popd
-  make || return 1
-  make DESTDIR=${startdir}/pkg install
-  rm -rf ${startdir}/pkg/usr/{mysql-test,sql-bench}
-  install -D -m644 ../my.cnf ${startdir}/pkg/etc/my.cnf
-  install -D -m755 ../mysqld ${startdir}/pkg/etc/rc.d/mysqld
-  install -D -m644 ../mysqld.conf.d ${startdir}/pkg/etc/conf.d/mysqld
-  rm -f ${startdir}/pkg/usr/bin/mysql_config
-}
-
-
diff --git a/abs/mv-core/mysql/my.cnf b/abs/mv-core/mysql/my.cnf
deleted file mode 100644
index 5775958..0000000
--- a/abs/mv-core/mysql/my.cnf
+++ /dev/null
@@ -1,150 +0,0 @@
-# mysql config file for medium systems.
-#
-# This is for a system with little memory (32M - 64M) where MySQL plays
-# a important part and systems up to 128M where MySQL is used together with
-# other programs (like a web server)
-#
-# One can in this file use all long options that the program supports.
-# If you want to know which options a program support, run the program
-# with --help option.
-
-# The following options will be passed to all MySQL clients
-[client]
-#password	= [REDACTED]
-port		= 3306
-socket		= /tmp/mysql.sock
-
-# Here follows entries for some specific programs
-
-# The MySQL server
-[mysqld]
-port		= 3306
-socket		= /tmp/mysql.sock
-datadir		= /data/srv/mysql
-skip-locking
-key_buffer = 16M
-max_allowed_packet = 1M
-table_cache = 64
-sort_buffer_size = 512K
-net_buffer_length = 16K
-myisam_sort_buffer_size = 8M
-local-infile=1
-
-# Don't listen on a TCP/IP port at all. This can be a security enhancement,
-# if all processes that need to connect to mysqld run on the same host.
-# All interaction with mysqld must be made via Unix sockets or named pipes.
-# Note that using this option without enabling named pipes on Windows
-# (via the "enable-named-pipe" option) will render mysqld useless!
-# 
-#skip-networking
-
-# Replication Master Server (default)
-# binary logging is required for replication
-#log-bin
-
-# required unique id between 1 and 2^32 - 1
-# defaults to 1 if master-host is not set
-# but will not function as a master if omitted
-server-id	= 1
-# Replication Slave (comment out master section to use this)
-#
-# To configure this host as a replication slave, you can choose between
-# two methods :
-#
-# 1) Use the CHANGE MASTER TO command (fully described in our manual) -
-#    the syntax is:
-#
-#    CHANGE MASTER TO MASTER_HOST=<host>, MASTER_PORT=<port>,
-#    MASTER_USER=<user>, MASTER_PASSWORD=<password> ;
-#
-#    where you replace <host>, <user>, <password> by quoted strings and
-#    <port> by the master's port number (3306 by default).
-#
-#    Example:
-#
-#    CHANGE MASTER TO MASTER_HOST='125.564.12.1', MASTER_PORT=3306,
-#    MASTER_USER='joe', MASTER_PASSWORD='[REDACTED]
-#
-# OR
-#
-# 2) Set the variables below. However, in case you choose this method, then
-#    start replication for the first time (even unsuccessfully, for example
-#    if you mistyped the password in master-password and the slave fails to
-#    connect), the slave will create a master.info file, and any later
-#    change in this file to the variables' values below will be ignored and
-#    overridden by the content of the master.info file, unless you shutdown
-#    the slave server, delete master.info and restart the slaver server.
-#    For that reason, you may want to leave the lines below untouched
-#    (commented) and instead use CHANGE MASTER TO (see above)
-#
-# required unique id between 2 and 2^32 - 1
-# (and different from the master)
-# defaults to 2 if master-host is set
-# but will not function as a slave if omitted
-#server-id       = 2
-#
-# The replication master for this slave - required
-#master-host     =   <hostname>
-#
-# The username the slave will use for authentication when connecting
-# to the master - required
-#master-user     =   <username>
-#
-# The password the slave will authenticate with when connecting to
-# the master - required
-#master-password =   <password>
-#
-# The port the master is listening on.
-# optional - defaults to 3306
-#master-port     =  <port>
-#
-# binary logging - not required for slaves, but recommended
-#log-bin
-
-# Point the following paths to different dedicated disks
-#tmpdir		= /tmp/		
-#log-update 	= /path-to-dedicated-directory/hostname
-
-# Uncomment the following if you are using BDB tables
-#bdb_cache_size = 4M
-#bdb_max_lock = 10000
-
-# Uncomment the following if you are using InnoDB tables
-#innodb_data_home_dir = /var/lib/mysql
-#innodb_data_file_path = ibdata1:10M:autoextend
-#innodb_log_group_home_dir = /var/lib/mysql
-#innodb_log_arch_dir = /var/lib/mysql
-# You can set .._buffer_pool_size up to 50 - 80 %
-# of RAM but beware of setting memory usage too high
-#innodb_buffer_pool_size = 16M
-#innodb_additional_mem_pool_size = 2M
-# Set .._log_file_size to 25 % of buffer pool size
-#innodb_log_file_size = 5M
-#innodb_log_buffer_size = 8M
-#innodb_flush_log_at_trx_commit = 1
-#innodb_lock_wait_timeout = 50
-
-[mysqldump]
-quick
-max_allowed_packet = 16M
-
-[mysql]
-#no-auto-rehash
-# Remove the next comment character if you are not familiar with SQL
-#safe-updates
-local-infile=1
-
-[isamchk]
-key_buffer = 20M
-sort_buffer_size = 20M
-read_buffer = 2M
-write_buffer = 2M
-
-[myisamchk]
-key_buffer = 20M
-sort_buffer_size = 20M
-read_buffer = 2M
-write_buffer = 2M
-
-[mysqlhotcopy]
-interactive-timeout
diff --git a/abs/mv-core/mysql/my.cnf.mv b/abs/mv-core/mysql/my.cnf.mv
deleted file mode 100644
index 5775958..0000000
--- a/abs/mv-core/mysql/my.cnf.mv
+++ /dev/null
@@ -1,150 +0,0 @@
-# mysql config file for medium systems.
-#
-# This is for a system with little memory (32M - 64M) where MySQL plays
-# a important part and systems up to 128M where MySQL is used together with
-# other programs (like a web server)
-#
-# One can in this file use all long options that the program supports.
-# If you want to know which options a program support, run the program
-# with --help option.
-
-# The following options will be passed to all MySQL clients
-[client]
-#password	= [REDACTED]
-port		= 3306
-socket		= /tmp/mysql.sock
-
-# Here follows entries for some specific programs
-
-# The MySQL server
-[mysqld]
-port		= 3306
-socket		= /tmp/mysql.sock
-datadir		= /data/srv/mysql
-skip-locking
-key_buffer = 16M
-max_allowed_packet = 1M
-table_cache = 64
-sort_buffer_size = 512K
-net_buffer_length = 16K
-myisam_sort_buffer_size = 8M
-local-infile=1
-
-# Don't listen on a TCP/IP port at all. This can be a security enhancement,
-# if all processes that need to connect to mysqld run on the same host.
-# All interaction with mysqld must be made via Unix sockets or named pipes.
-# Note that using this option without enabling named pipes on Windows
-# (via the "enable-named-pipe" option) will render mysqld useless!
-# 
-#skip-networking
-
-# Replication Master Server (default)
-# binary logging is required for replication
-#log-bin
-
-# required unique id between 1 and 2^32 - 1
-# defaults to 1 if master-host is not set
-# but will not function as a master if omitted
-server-id	= 1
-# Replication Slave (comment out master section to use this)
-#
-# To configure this host as a replication slave, you can choose between
-# two methods :
-#
-# 1) Use the CHANGE MASTER TO command (fully described in our manual) -
-#    the syntax is:
-#
-#    CHANGE MASTER TO MASTER_HOST=<host>, MASTER_PORT=<port>,
-#    MASTER_USER=<user>, MASTER_PASSWORD=<password> ;
-#
-#    where you replace <host>, <user>, <password> by quoted strings and
-#    <port> by the master's port number (3306 by default).
-#
-#    Example:
-#
-#    CHANGE MASTER TO MASTER_HOST='125.564.12.1', MASTER_PORT=3306,
-#    MASTER_USER='joe', MASTER_PASSWORD='[REDACTED]
-#
-# OR
-#
-# 2) Set the variables below. However, in case you choose this method, then
-#    start replication for the first time (even unsuccessfully, for example
-#    if you mistyped the password in master-password and the slave fails to
-#    connect), the slave will create a master.info file, and any later
-#    change in this file to the variables' values below will be ignored and
-#    overridden by the content of the master.info file, unless you shutdown
-#    the slave server, delete master.info and restart the slaver server.
-#    For that reason, you may want to leave the lines below untouched
-#    (commented) and instead use CHANGE MASTER TO (see above)
-#
-# required unique id between 2 and 2^32 - 1
-# (and different from the master)
-# defaults to 2 if master-host is set
-# but will not function as a slave if omitted
-#server-id       = 2
-#
-# The replication master for this slave - required
-#master-host     =   <hostname>
-#
-# The username the slave will use for authentication when connecting
-# to the master - required
-#master-user     =   <username>
-#
-# The password the slave will authenticate with when connecting to
-# the master - required
-#master-password =   <password>
-#
-# The port the master is listening on.
-# optional - defaults to 3306
-#master-port     =  <port>
-#
-# binary logging - not required for slaves, but recommended
-#log-bin
-
-# Point the following paths to different dedicated disks
-#tmpdir		= /tmp/		
-#log-update 	= /path-to-dedicated-directory/hostname
-
-# Uncomment the following if you are using BDB tables
-#bdb_cache_size = 4M
-#bdb_max_lock = 10000
-
-# Uncomment the following if you are using InnoDB tables
-#innodb_data_home_dir = /var/lib/mysql
-#innodb_data_file_path = ibdata1:10M:autoextend
-#innodb_log_group_home_dir = /var/lib/mysql
-#innodb_log_arch_dir = /var/lib/mysql
-# You can set .._buffer_pool_size up to 50 - 80 %
-# of RAM but beware of setting memory usage too high
-#innodb_buffer_pool_size = 16M
-#innodb_additional_mem_pool_size = 2M
-# Set .._log_file_size to 25 % of buffer pool size
-#innodb_log_file_size = 5M
-#innodb_log_buffer_size = 8M
-#innodb_flush_log_at_trx_commit = 1
-#innodb_lock_wait_timeout = 50
-
-[mysqldump]
-quick
-max_allowed_packet = 16M
-
-[mysql]
-#no-auto-rehash
-# Remove the next comment character if you are not familiar with SQL
-#safe-updates
-local-infile=1
-
-[isamchk]
-key_buffer = 20M
-sort_buffer_size = 20M
-read_buffer = 2M
-write_buffer = 2M
-
-[myisamchk]
-key_buffer = 20M
-sort_buffer_size = 20M
-read_buffer = 2M
-write_buffer = 2M
-
-[mysqlhotcopy]
-interactive-timeout
diff --git a/abs/mv-core/mysql/mysql-no-clients.patch b/abs/mv-core/mysql/mysql-no-clients.patch
deleted file mode 100644
index e1fb5e0..0000000
--- a/abs/mv-core/mysql/mysql-no-clients.patch
+++ /dev/null
@@ -1,65 +0,0 @@
-diff -ruN mysql-5.0.51.orig/Makefile.in mysql-5.0.51/Makefile.in
---- mysql-5.0.51.orig/Makefile.in	2007-12-07 12:59:21.000000000 +0000
-+++ mysql-5.0.51/Makefile.in	2007-12-07 13:03:21.000000000 +0000
-@@ -376,7 +376,7 @@
- SUBDIRS = . include @docs_dirs@ @zlib_dir@ @yassl_dir@ \
- 			@readline_topdir@ sql-common scripts \
- 			@thread_dirs@ pstack \
--			@sql_union_dirs@ @man_dirs@ tests \
-+			strings mysys dbug extra regex bdb innobase myisam myisammrg heap vio sql @man_dirs@ tests \
- 			netware @libmysqld_dirs@ \
- 			@bench_dirs@ support-files @tools_dirs@
- 
-diff -ruN mysql-5.0.51.orig/include/Makefile.in mysql-5.0.51/include/Makefile.in
---- mysql-5.0.51.orig/include/Makefile.in	2007-12-07 12:59:20.000000000 +0000
-+++ mysql-5.0.51/include/Makefile.in	2007-12-07 13:00:12.000000000 +0000
-@@ -557,7 +557,6 @@
- 	  test -z "$$dir" || $(mkdir_p) "$$dir"; \
- 	done
- install: $(BUILT_SOURCES)
--	$(MAKE) $(AM_MAKEFLAGS) install-am
- install-exec: install-exec-am
- install-data: install-data-am
- uninstall: uninstall-am
-diff -ruN mysql-5.0.51.orig/tests/Makefile.in mysql-5.0.51/tests/Makefile.in
---- mysql-5.0.51.orig/tests/Makefile.in	2007-12-07 12:59:20.000000000 +0000
-+++ mysql-5.0.51/tests/Makefile.in	2007-12-07 13:01:51.000000000 +0000
-@@ -96,7 +96,7 @@
- am_mysql_client_test_OBJECTS = mysql_client_test.$(OBJEXT) \
- 	my_memmem.$(OBJEXT)
- mysql_client_test_OBJECTS = $(am_mysql_client_test_OBJECTS)
--am__DEPENDENCIES_1 = $(top_builddir)/libmysql/libmysqlclient.la
-+am__DEPENDENCIES_1 = /usr/lib/mysql/libmysqlclient.so
- am__DEPENDENCIES_2 =
- mysql_client_test_DEPENDENCIES = $(am__DEPENDENCIES_1) \
- 	$(am__DEPENDENCIES_2)
-@@ -106,7 +106,7 @@
- thread_test_SOURCES = thread_test.c
- thread_test_OBJECTS = thread_test.$(OBJEXT)
- thread_test_LDADD = $(LDADD)
--thread_test_DEPENDENCIES = $(top_builddir)/libmysql/libmysqlclient.la
-+thread_test_DEPENDENCIES = /usr/lib/mysql/libmysqlclient.so
- DEFAULT_INCLUDES = -I. -I$(srcdir) -I$(top_builddir)/include
- depcomp = $(SHELL) $(top_srcdir)/depcomp
- am__depfiles_maybe = depfiles
-@@ -405,7 +405,7 @@
- 			$(openssl_includes)
- 
- LDADD = @CLIENT_EXTRA_LDFLAGS@ \
--                        $(top_builddir)/libmysql/libmysqlclient.la
-+                        /usr/lib/mysql/libmysqlclient.so
- 
- mysql_client_test_LDADD = $(LDADD) $(CXXLDFLAGS)
- mysql_client_test_SOURCES = mysql_client_test.c\
-diff -ruN mysql-5.0.51.orig/tools/Makefile.in mysql-5.0.51/tools/Makefile.in
---- mysql-5.0.51.orig/tools/Makefile.in	2007-12-07 12:59:19.000000000 +0000
-+++ mysql-5.0.51/tools/Makefile.in	2007-12-07 13:02:32.000000000 +0000
-@@ -369,7 +369,7 @@
- 		$(openssl_includes)
- 
- LDADD = @CLIENT_EXTRA_LDFLAGS@ \
--		$(top_builddir)/libmysql_r/libmysqlclient_r.la \
-+		/usr/lib/mysql/libmysqlclient_r.so \
- 		@openssl_libs@ @yassl_libs@ @ZLIB_LIBS@
- 
- mysqltestmanager_SOURCES = mysqlmanager.c
diff --git a/abs/mv-core/mysql/mysqld b/abs/mv-core/mysql/mysqld
deleted file mode 100755
index e7f90d2..0000000
--- a/abs/mv-core/mysql/mysqld
+++ /dev/null
@@ -1,87 +0,0 @@
-#!/bin/bash
-
-MYSQLD_ROOT="/var/lib/mysql"
-# source application-specific settings
-[ -f /etc/conf.d/mysqld ] && . /etc/conf.d/mysqld
-
-# general config
-. /etc/rc.conf
-. /etc/rc.d/functions
-
-PID=`pidof -o %PPID /usr/sbin/mysqld`
-if [ ! `egrep '^mysql:' /etc/group` ]; then
-  stat_busy "Adding mysql group"
-  groupadd -g 89 mysql
-  stat_done
-fi
-if [ ! `egrep '^mysql:' /etc/passwd` ]; then
-  stat_busy "Adding mysql user"
-  useradd -u 89 -g mysql -d $MYSQLD_ROOT -s /bin/false mysql
-  [ -d $MYSQLD_ROOT ] && chown -R mysql.mysql $MYSQLD_ROOT
-  stat_done
-fi
-
-if [ ! -d $MYSQLD_ROOT ]; then
-  mkdir $MYSQLD_ROOT
-  /usr/bin/mysql_install_db --datadir=$MYSQLD_ROOT --user=mysql 2>/dev/null > /dev/null
-  chown -R mysql.mysql $MYSQLD_ROOT
-fi
-
-if [ ! -e /var/log/mysqld.log ]; then
-  touch /var/log/mysqld.log
-  chown mysql /var/log/mysqld.log
-fi
-
-case "$1" in
-  start)
-    stat_busy "Starting MySQL"
-    if [ -z "$PID" ]; then
-       /usr/bin/mysqld_safe --datadir=$MYSQLD_ROOT  2>/dev/null >/dev/null &
-      if [ $? -gt 0 ]; then
-        stat_fail
-        exit 1
-      else
-        sleep 1 # wait on children
-        PID=`pidof -o %PPID /usr/sbin/mysqld`
-        if [ -z "$PID" ]; then
-          stat_fail
-          exit 1
-        else
-          echo $PID >/var/run/mysqld.pid
-          add_daemon mysqld
-          stat_done
-        fi
-      fi
-    else
-      stat_fail
-      exit 1
-    fi
-    ;;
-
-  stop)
-    stat_busy "Stopping MySQL"
-    if [ ! -z "$PID" ]; then
-      kill $PID &> /dev/null      
-      if [ $? -gt 0 ]; then
-        stat_fail
-        exit 1
-      else
-        rm -f /var/run/mysqld.pid &>/dev/null
-        rm_daemon mysqld
-        stat_done
-      fi
-    else
-      stat_fail
-      exit 1
-    fi
-    ;;
-
-  restart)
-    $0 stop
-    sleep 3
-    $0 start
-    ;;
-  *)
-    echo "usage: $0 {start|stop|restart}"  
-esac
-exit 0
diff --git a/abs/mv-core/mysql/mysqld.conf.d b/abs/mv-core/mysql/mysqld.conf.d
deleted file mode 100644
index 10b7098..0000000
--- a/abs/mv-core/mysql/mysqld.conf.d
+++ /dev/null
@@ -1 +0,0 @@
-MYSQLD_ROOT="/data/srv/mysql"
-- 
cgit v0.12

