From 6d4fe104ad3739e1bd5a948ed356f6f0fe357760 Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Mon, 22 Jun 2009 18:41:48 -0500
Subject: linhes-config: remove forced error, used for testing.

---
 abs/core-testing/LinHES-config/PKGBUILD         | 2 +-
 abs/core-testing/LinHES-config/install_proxy.sh | 5 ++++-
 2 files changed, 5 insertions(+), 2 deletions(-)

diff --git a/abs/core-testing/LinHES-config/PKGBUILD b/abs/core-testing/LinHES-config/PKGBUILD
index 72a6472..676c13f 100755
--- a/abs/core-testing/LinHES-config/PKGBUILD
+++ b/abs/core-testing/LinHES-config/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=LinHES-config
 pkgver=2.0
-pkgrel=22
+pkgrel=25
 conflicts=(MythVantage-config MythVantage-config-dev LinHES-config-dev )
 pkgdesc="Install and configure your system"
 depends=(bc libstatgrab  mysql-python expect curl dnsutils parted sg3_utils nmbscan system-templates rsync python-parted ddcxinfo)
diff --git a/abs/core-testing/LinHES-config/install_proxy.sh b/abs/core-testing/LinHES-config/install_proxy.sh
index 4d4160a..bedacbf 100755
--- a/abs/core-testing/LinHES-config/install_proxy.sh
+++ b/abs/core-testing/LinHES-config/install_proxy.sh
@@ -33,7 +33,10 @@ case $1 in
              mv_install.py --rootdisk=$disk --rootfs=$rootfs --rootsize=$rootsize --datafs=$datafs --datasize=$datasize --datadisk=$disk --swapsize=$swapsize -c full_install
              rc=$?
              echo "mv_install.py exit code $rc"
-             echo "mv_install error" >> /tmp/.install_error
+             if [ $rc != 0 ]
+             then
+                echo "mv_install error" >> /tmp/.install_error
+             fi
              exit $rc
             ;;
 
-- 
cgit v0.12

