From fb189ef50487b8b9feceb34237c95e805e61ba55 Mon Sep 17 00:00:00 2001
From: James Meyer <james.meyer@operamail.com>
Date: Thu, 2 Apr 2009 14:34:55 -0500
Subject: LinHES-config: change min size of OS partition to 3GB. At this point
 a Standalone install takes about 2.5GB Closes FS#312

http://linhes.org/flyspray/index.php?do=details&task_id=312
---
 abs/core-testing/LinHES-config/PKGBUILD | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

diff --git a/abs/core-testing/LinHES-config/PKGBUILD b/abs/core-testing/LinHES-config/PKGBUILD
index 1d15a84..d7d8455 100644
--- a/abs/core-testing/LinHES-config/PKGBUILD
+++ b/abs/core-testing/LinHES-config/PKGBUILD
@@ -1,6 +1,6 @@
 pkgname=LinHES-config
 pkgver=1.0
-pkgrel=362
+pkgrel=364
 conflicts=(MythVantage-config MythVantage-config-dev LinHES-config-dev )
 pkgdesc="Install and configure your system"
 depends=(bc libstatgrab  mysql-python expect curl dnsutils parted sg3_utils nmbscan system-templates )
-- 
cgit v0.12

